Center at RA 12 28 24.96602 DEC 31 28 37.6289

CONT: J1228+31 IPOL 1646.021 MHZ J1228+3128.ICL001.1

PLot file version 1 created 31-JAN-2003 15:21:44

Cont peak flux = 2.4350E-01 JY/BEAM Levs = 2.435E-01 * (-0.018, 0.018, 0.035, 0.070, 0.140, 0.281, 0.561)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250