IF 1 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 55 created 27-JAN-2003 12:53:07

400 200 0

EF - MC ( 1 - 2 )

100 0 -100

MilliJanskys

400 200 0

EF - WB ( 1 - 3 )

100 0 -100 400 200 0

EF - ON ( 1 - 4 )

Degrees

100 0 -100 400 200 0

EF - TR ( 1 - 5 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 1 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 56 created 27-JAN-2003 12:53:07

400 200 0

EF - JB ( 1 - 6 )

100 0 -100

MilliJanskys

400 200 0

EF - CM ( 1 - 7 )

100 0 -100 400 200 0

EF - UR ( 1 - 8 )

Degrees

100 0 -100 400 200 0

EF - SH ( 1 - 9 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 1 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 57 created 27-JAN-2003 12:53:07

400 200 0

EF - HH ( 1 - 10 )

100 0 -100

MilliJanskys

400 200 0

EF - AR ( 1 - 11 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 2 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 58 created 27-JAN-2003 12:53:09

400 200 0

EF - MC ( 1 - 2 )

100 0 -100

MilliJanskys

400 200 0

EF - WB ( 1 - 3 )

100 0 -100 400 200 0

EF - ON ( 1 - 4 )

Degrees

100 0 -100 400 200 0

EF - TR ( 1 - 5 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 2 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 59 created 27-JAN-2003 12:53:09

400 200 0

EF - JB ( 1 - 6 )

100 0 -100

MilliJanskys

400 200 0

EF - CM ( 1 - 7 )

100 0 -100 400 200 0

EF - UR ( 1 - 8 )

Degrees

100 0 -100 400 200 0

EF - SH ( 1 - 9 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 2 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 60 created 27-JAN-2003 12:53:09

400 200 0

EF - HH ( 1 - 10 )

100 0 -100

MilliJanskys

400 200 0

EF - AR ( 1 - 11 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 3 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 61 created 27-JAN-2003 12:53:11

400 200 0

EF - MC ( 1 - 2 )

100 0 -100

MilliJanskys

400 200 0

EF - WB ( 1 - 3 )

100 0 -100 400 200 0

EF - ON ( 1 - 4 )

Degrees

100 0 -100 400 200 0

EF - TR ( 1 - 5 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 3 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 62 created 27-JAN-2003 12:53:11

400 200 0

EF - JB ( 1 - 6 )

100 0 -100

MilliJanskys

400 200 0

EF - CM ( 1 - 7 )

100 0 -100 400 200 0

EF - UR ( 1 - 8 )

Degrees

100 0 -100 400 200 0

EF - SH ( 1 - 9 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 3 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 63 created 27-JAN-2003 12:53:11

400 200 0

EF - HH ( 1 - 10 )

100 0 -100

MilliJanskys

400 200 0

EF - AR ( 1 - 11 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 4 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 64 created 27-JAN-2003 12:53:13

400 200 0

EF - MC ( 1 - 2 )

100 0 -100

MilliJanskys

400 200 0

EF - WB ( 1 - 3 )

100 0 -100 400 200 0

EF - ON ( 1 - 4 )

Degrees

100 0 -100 400 200 0

EF - TR ( 1 - 5 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 4 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 65 created 27-JAN-2003 12:53:13

400 200 0

EF - JB ( 1 - 6 )

100 0 -100

MilliJanskys

400 200 0

EF - CM ( 1 - 7 )

100 0 -100 400 200 0

EF - UR ( 1 - 8 )

Degrees

100 0 -100 400 200 0

EF - SH ( 1 - 9 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 4 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 66 created 27-JAN-2003 12:53:13

400 200 0

EF - HH ( 1 - 10 )

100 0 -100

MilliJanskys

400 200 0

EF - AR ( 1 - 11 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 6 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 69 created 27-JAN-2003 12:53:18

400 200 0

EF - WB ( 1 - 3 )

100 0 -100

MilliJanskys

400 200 0

EF - ON ( 1 - 4 )

100 0 -100 400 200 0

EF - TR ( 1 - 5 )

Degrees

100 0 -100 400 200 0

EF - JB ( 1 - 6 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 6 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 70 created 27-JAN-2003 12:53:18

400 200 0

EF - UR ( 1 - 8 )

100 0 -100

MilliJanskys

400 200 0

EF - SH ( 1 - 9 )

100 0 -100 400 200 0

EF - HH ( 1 - 10 )

Degrees

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 7 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 71 created 27-JAN-2003 12:53:20

400 200 0

EF - WB ( 1 - 3 )

100 0 -100

MilliJanskys

400 200 0

EF - ON ( 1 - 4 )

100 0 -100 400 200 0

EF - TR ( 1 - 5 )

Degrees

100 0 -100 400 200 0

EF - JB ( 1 - 6 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 7 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 72 created 27-JAN-2003 12:53:20

400 200 0

EF - UR ( 1 - 8 )

100 0 -100

MilliJanskys

400 200 0

EF - SH ( 1 - 9 )

100 0 -100 400 200 0

EF - HH ( 1 - 10 )

Degrees

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 8 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 73 created 27-JAN-2003 12:53:22

400 200 0

EF - WB ( 1 - 3 )

100 0 -100

MilliJanskys

400 200 0

EF - ON ( 1 - 4 )

100 0 -100 400 200 0

EF - TR ( 1 - 5 )

Degrees

100 0 -100 400 200 0

EF - JB ( 1 - 6 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 8 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 74 created 27-JAN-2003 12:53:22

400 200 0

EF - UR ( 1 - 8 )

100 0 -100

MilliJanskys

400 200 0

EF - SH ( 1 - 9 )

100 0 -100 400 200 0

EF - HH ( 1 - 10 )

Degrees

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 1 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 75 created 27-JAN-2003 12:53:24

400 200 0

EF - MC ( 1 - 2 )

100 0 -100

MilliJanskys

400 200 0

EF - WB ( 1 - 3 )

100 0 -100 400 200 0

EF - ON ( 1 - 4 )

Degrees

100 0 -100 400 200 0

EF - TR ( 1 - 5 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 1 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 76 created 27-JAN-2003 12:53:24

400 200 0

EF - JB ( 1 - 6 )

100 0 -100

MilliJanskys

400 200 0

EF - CM ( 1 - 7 )

100 0 -100 400 200 0

EF - UR ( 1 - 8 )

Degrees

100 0 -100 400 200 0

EF - SH ( 1 - 9 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 1 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 77 created 27-JAN-2003 12:53:24

400 200 0

EF - HH ( 1 - 10 )

100 0 -100

MilliJanskys

400 200 0

EF - AR ( 1 - 11 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 2 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 78 created 27-JAN-2003 12:53:26

400 200 0

EF - MC ( 1 - 2 )

100 0 -100

MilliJanskys

400 200 0

EF - WB ( 1 - 3 )

100 0 -100 400 200 0

EF - ON ( 1 - 4 )

Degrees

100 0 -100 400 200 0

EF - TR ( 1 - 5 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 2 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 79 created 27-JAN-2003 12:53:27

400 200 0

EF - JB ( 1 - 6 )

100 0 -100

MilliJanskys

400 200 0

EF - CM ( 1 - 7 )

100 0 -100 400 200 0

EF - UR ( 1 - 8 )

Degrees

100 0 -100 400 200 0

EF - SH ( 1 - 9 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 2 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 80 created 27-JAN-2003 12:53:27

400 200 0

EF - HH ( 1 - 10 )

100 0 -100

MilliJanskys

400 200 0

EF - AR ( 1 - 11 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 3 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 81 created 27-JAN-2003 12:53:29

400 200 0

EF - MC ( 1 - 2 )

100 0 -100

MilliJanskys

400 200 0

EF - WB ( 1 - 3 )

100 0 -100 400 200 0

EF - ON ( 1 - 4 )

Degrees

100 0 -100 400 200 0

EF - TR ( 1 - 5 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 4 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 84 created 27-JAN-2003 12:53:31

400 200 0

EF - MC ( 1 - 2 )

100 0 -100

MilliJanskys

400 200 0

EF - WB ( 1 - 3 )

100 0 -100 400 200 0

EF - ON ( 1 - 4 )

Degrees

100 0 -100 400 200 0

EF - TR ( 1 - 5 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 4 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 85 created 27-JAN-2003 12:53:31

400 200 0

EF - JB ( 1 - 6 )

100 0 -100

MilliJanskys

400 200 0

EF - CM ( 1 - 7 )

100 0 -100 400 200 0

EF - UR ( 1 - 8 )

Degrees

100 0 -100 400 200 0

EF - SH ( 1 - 9 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 4 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 86 created 27-JAN-2003 12:53:31

400 200 0

EF - HH ( 1 - 10 )

100 0 -100

MilliJanskys

400 200 0

EF - AR ( 1 - 11 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 5 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 87 created 27-JAN-2003 12:53:33

400 200 0

EF - WB ( 1 - 3 )

100 0 -100

MilliJanskys

400 200 0

EF - ON ( 1 - 4 )

100 0 -100 400 200 0

EF - TR ( 1 - 5 )

Degrees

100 0 -100 400 200 0

EF - JB ( 1 - 6 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 5 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 88 created 27-JAN-2003 12:53:33

400 200 0

EF - UR ( 1 - 8 )

100 0 -100

MilliJanskys

400 200 0

EF - SH ( 1 - 9 )

100 0 -100 400 200 0

EF - HH ( 1 - 10 )

Degrees

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 6 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 89 created 27-JAN-2003 12:53:35

400 200 0

EF - WB ( 1 - 3 )

100 0 -100

MilliJanskys

400 200 0

EF - ON ( 1 - 4 )

100 0 -100 400 200 0

EF - TR ( 1 - 5 )

Degrees

100 0 -100 400 200 0

EF - JB ( 1 - 6 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 6 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 90 created 27-JAN-2003 12:53:35

400 200 0

EF - UR ( 1 - 8 )

100 0 -100

MilliJanskys

400 200 0

EF - SH ( 1 - 9 )

100 0 -100 400 200 0

EF - HH ( 1 - 10 )

Degrees

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 7 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 91 created 27-JAN-2003 12:53:37

400 200 0

EF - WB ( 1 - 3 )

100 0 -100

MilliJanskys

400 200 0

EF - ON ( 1 - 4 )

100 0 -100 400 200 0

EF - TR ( 1 - 5 )

Degrees

100 0 -100 400 200 0

EF - JB ( 1 - 6 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 7 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 92 created 27-JAN-2003 12:53:37

400 200 0

EF - UR ( 1 - 8 )

100 0 -100

MilliJanskys

400 200 0

EF - SH ( 1 - 9 )

100 0 -100 400 200 0

EF - HH ( 1 - 10 )

Degrees

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 8 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 93 created 27-JAN-2003 12:53:39

400 200 0

EF - WB ( 1 - 3 )

100 0 -100

MilliJanskys

400 200 0

EF - ON ( 1 - 4 )

100 0 -100 400 200 0

EF - TR ( 1 - 5 )

Degrees

100 0 -100 400 200 0

EF - JB ( 1 - 6 )

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100

IF 8 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for n02l3.UVAVG.1 Vect aver.

PLot file version 94 created 27-JAN-2003 12:53:40

400 200 0

EF - UR ( 1 - 8 )

100 0 -100

MilliJanskys

400 200 0

EF - SH ( 1 - 9 )

100 0 -100 400 200 0

EF - HH ( 1 - 10 )

Degrees

TIME (HOURS)

05 00 30 06 00 30 07 00 30

100 0 -100