838084008420844084608480

0

-10

-20

Plot file version 33 created 22-APR-2002 18:28:48 DA193 n02x1.VBGLU.1 Freq = 8.3622 GHz, Bw = 8.000 MHz No calibration applied

Lower frame: Real Jy Total-power spectrum IF range: 1 - 16 Timerange: 00/15:00:08 to 00/15:22:08 Antenna: * Stokes: RR

EF

838084008420844084608480

1.2 0.8 0.4 0.0

MC

838084008420844084608480

1.2

0.8

0.4

ON

838084008420844084608480

1.0

0.0

WB

838084008420844084608480

1.6 1.2 0.8 0.4 0.0

SH

838084008420844084608480

1.2 0.8 0.4 0.0

UR

Mega Hz

838084008420844084608480

0 -10 -20 -30 -40

YB

838084008420844084608480

0

-10

-20

Plot file version 34 created 22-APR-2002 18:29:13 DA193 n02x1.VBGLU.1 Freq = 8.3622 GHz, Bw = 8.000 MHz No calibration applied

Lower frame: Real Jy Total-power spectrum IF range: 1 - 16 Timerange: 00/15:23:07 to 00/15:45:07 Antenna: * Stokes: RR

EF

838084008420844084608480

1.2 0.8 0.4 0.0

MC

838084008420844084608480

1.4

1.0

0.6

ON

838084008420844084608480

1.0

0.0

WB

838084008420844084608480

1.6 1.2 0.8 0.4 0.0

SH

838084008420844084608480

1.2 0.8 0.4 0.0

UR

838084008420844084608480

5 -5 -15 -25

Plot file version 35 created 22-APR-2002 18:29:32 DA193 n02x1.VBGLU.1 Freq = 8.3622 GHz, Bw = 8.000 MHz No calibration applied

Lower frame: Real Jy Total-power spectrum IF range: 1 - 16 Timerange: 00/15:49:09 to 00/16:11:09 Antenna: * Stokes: RR

EF

838084008420844084608480

1.2 0.8 0.4 0.0

MC

838084008420844084608480

1.3 1.1 0.9 0.7 0.5

ON

838084008420844084608480

1.0

0.0

WB

838084008420844084608480

1.6 1.2 0.8 0.4 0.0

SH

838084008420844084608480

1.2 0.8 0.4 0.0

UR

838084008420844084608480

0 -10 -20

Plot file version 36 created 22-APR-2002 18:29:57 DA193 n02x1.VBGLU.1 Freq = 8.3622 GHz, Bw = 8.000 MHz No calibration applied

Lower frame: Real Jy Total-power spectrum IF range: 1 - 16 Timerange: 00/16:11:10 to 00/16:33:10 Antenna: * Stokes: RR

EF

838084008420844084608480

1.2 0.8 0.4 0.0

MC

838084008420844084608480

1.1 0.9 0.7 0.5

ON

838084008420844084608480

1.0

0.0

WB

838084008420844084608480

1.6 1.2 0.8 0.4 0.0

SH

838084008420844084608480

1.2 0.8 0.4 0.0

UR

Mega Hz

838084008420844084608480

10

0

-10

YB

838084008420844084608480

5 -5 -15 -25

Plot file version 37 created 22-APR-2002 18:30:23 DA193 n02x1.VBGLU.1 Freq = 8.3622 GHz, Bw = 8.000 MHz No calibration applied

Lower frame: Real Jy Total-power spectrum IF range: 1 - 16 Timerange: 00/16:33:11 to 00/16:55:11 Antenna: * Stokes: RR

EF

838084008420844084608480

1.2 0.8 0.4 0.0

MC

838084008420844084608480

1.1 0.9 0.7 0.5

ON

838084008420844084608480

1.0

0.0

WB

838084008420844084608480

1.2 0.8 0.4 0.0

SH

838084008420844084608480

1.2 0.8 0.4 0.0

UR

Mega Hz

838084008420844084608480

0

-10

YB

838084008420844084608480

5 -5 -15 -25

Plot file version 38 created 22-APR-2002 18:30:48 DA193 n02x1.VBGLU.1 Freq = 8.3622 GHz, Bw = 8.000 MHz No calibration applied

Lower frame: Real Jy Total-power spectrum IF range: 1 - 16 Timerange: 00/16:55:12 to 00/17:17:12 Antenna: * Stokes: RR

EF

838084008420844084608480

1.2 0.8 0.4 0.0

MC

838084008420844084608480

1.1 0.9 0.7 0.5

ON

838084008420844084608480

1.0

0.0

WB

838084008420844084608480

1.6 1.2 0.8 0.4 0.0

SH

838084008420844084608480

1.2 0.8 0.4 0.0

UR

Mega Hz

838084008420844084608480

10

0

-10

YB

838084008420844084608480

1.2 0.8 0.4 0.0

Plot file version 39 created 22-APR-2002 18:31:05 DA193 n02x1.VBGLU.1 Freq = 8.3622 GHz, Bw = 8.000 MHz No calibration applied

Lower frame: Real Jy Total-power spectrum IF range: 1 - 16 Timerange: 00/17:17:13 to 00/17:20:59 Antenna: * Stokes: RR

EF

838084008420844084608480

1.2 0.8 0.4 0.0

MC

838084008420844084608480

1.3 1.1 0.9 0.7 0.5

ON

838084008420844084608480

1.0

0.0

WB

838084008420844084608480

1.2 0.8 0.4 0.0

SH

838084008420844084608480

1.2 0.8 0.4 0.0

UR

Mega Hz

838084008420844084608480

0

-10

YB