Center at RA 05 18 05.14246 DEC 33 06 13.3646

CONT: J0518+33 IPOL 1639.553 MHZ J0518+3306.IIM001.2

PLot file version 1 created 25-JUN-2003 15:13:02

Cont peak flux = 4.6969E-02 JY/BEAM Levs = 4.697E-02 * (-0.298, 0.298, 0.596)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250