Center at RA 20 31 54.99428 DEC 12 19 41.3404

CONT: 2029+121 IPOL 1639.553 MHZ 2029+121.ICL001.5

PLot file version 1 created 14-DEC-2003 17:37:52

Cont peak flux = 3.2392E-01 JY/BEAM Levs = 3.239E-01 * (-0.035, 0.035, 0.070, 0.140, 0.279, 0.558)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250