Center at RA 01 37 41.29943 DEC 33 09 35.1330

CONT: 3C48 IPOL 1639.553 MHZ 3C48.IIM001.1

PLot file version 1 created 08-DEC-2003 10:44:37

Cont peak flux = 6.7795E-01 JY/BEAM Levs = 6.779E-01 * (-0.200, 0.200, 0.400, 0.800)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250