Center at RA 03 19 48.16010 DEC 41 30 42.1031

CONT: 3C84 IPOL 1639.553 MHZ 3C84.ICL001.5

PLot file version 1 created 14-DEC-2003 17:37:06

Cont peak flux = 1.7558E+01 JY/BEAM Levs = 1.756E+01 * (-0.019, 0.019, 0.038, 0.076, 0.151, 0.303, 0.605)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250