Center at RA 05 55 30.80561 DEC 39 48 49.1650

CONT: DA193 IPOL 1639.553 MHZ DA193.ICL001.5

PLot file version 1 created 14-DEC-2003 17:36:35

Cont peak flux = 2.3545E+00 JY/BEAM Levs = 2.355E+00 * (-0.006, 0.006, 0.012, 0.025, 0.050, 0.100, 0.200, 0.399, 0.799)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250