Center at RA 14 07 00.39441 DEC 28 27 14.6900

CONT: OQ208 IPOL 6675.552 MHZ OQ208.ICL001.3

PLot file version 1 created 13-AUG-2003 15:50:47

Cont peak flux = 1.5032E+00 JY/BEAM Levs = 1.503E+00 * (-0.025, 0.025, 0.050, 0.099, 0.199, 0.398, 0.795)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100