Tsys vs UTC time for n03m1_2.MSORT.1 TY 1 Rpol IF 1 - 4

Plot file version 1 created 13-AUG-2003 15:36:47

1R EF IF 1 38 37 36 35 1R EF IF 2 38 37 36 35 1R EF IF 3

21.0

20.5

20.0 1R EF IF 4

21.0

20.5

20.0 2R MC IF 1 106 104 102 100 2R MC IF 2

Kelvin

106 104 102 100 2R MC IF 3 108 106 104 102 2R MC IF 4 108 106 104 102 3R JB IF 1 118 116 114 112 110 3R JB IF 2

TIME (HOURS)

19 00 30 20 00 30 21 00

118 116 114 112 110

Tsys vs UTC time for n03m1_2.MSORT.1 TY 1 Rpol IF 1 - 4

Plot file version 2 created 13-AUG-2003 15:36:47

3R JB IF 3 120 115 110 3R JB IF 4 120 115 110 4R ON IF 1 105 100 95 4R ON IF 2 105 100 95 4R ON IF 3 120 115 110 4R ON IF 4

Kelvin

120 115 110 5R CM IF 1

1.005 1.000 0.995

5R CM IF 2

1.005 1.000 0.995

5R CM IF 3

1.005 1.000 0.995

5R CM IF 4

TIME (HOURS)

19 00 30 20 00 30 21 00

1.005 1.000 0.995

Tsys vs UTC time for n03m1_2.MSORT.1 TY 1 Rpol IF 1 - 4

Plot file version 3 created 13-AUG-2003 15:36:47

6R TR IF 1

21.5 21.0 20.5 20.0 19.5 6R TR IF 2

21.5 21.0 20.5 20.0 19.5 6R TR IF 3

21.0 20.5 20.0 19.5 6R TR IF 4

21.0 20.5 20.0 19.5 7R HH IF 1

57.0 56.5 56.0 55.5 7R HH IF 2

Kelvin

57.0 56.5 56.0 55.5 7R HH IF 3

53.5 53.0 52.5 52.0

7R HH IF 4

TIME (HOURS)

19 00 30 20 00 30 21 00

53.5 53.0 52.5 52.0

Tsys vs UTC time for n03m1_2.MSORT.1 TY 1 Lpol IF 1 - 4

Plot file version 4 created 13-AUG-2003 15:36:47

1L EF IF 1 38 37 36 35 1L EF IF 2 38 37 36 35 1L EF IF 3

22.5 22.0 21.5

1L EF IF 4

22.5 22.0 21.5

2L MC IF 1 114 112 110 2L MC IF 2

Kelvin

114 112 110 2L MC IF 3 114 112 110 2L MC IF 4 114 112 110 3L JB IF 1 116 114 112 110 3L JB IF 2

TIME (HOURS)

19 00 30 20 00 30 21 00

116 114 112 110

Tsys vs UTC time for n03m1_2.MSORT.1 TY 1 Lpol IF 1 - 4

Plot file version 5 created 13-AUG-2003 15:36:47

3L JB IF 3 122 120 118 116 114 3L JB IF 4 122 120 118 116 114 4L ON IF 1 110 105 100 4L ON IF 2 110 105 100 4L ON IF 3 115 110 105 4L ON IF 4

Kelvin

115 110 105 5L CM IF 1

1.005 1.000 0.995

5L CM IF 2

1.005 1.000 0.995

5L CM IF 3

1.005 1.000 0.995

5L CM IF 4

TIME (HOURS)

19 00 30 20 00 30 21 00

1.005 1.000 0.995

Tsys vs UTC time for n03m1_2.MSORT.1 TY 1 Lpol IF 1 - 4

Plot file version 6 created 13-AUG-2003 15:36:47

6L TR IF 1

36.0 35.5 35.0

6L TR IF 2

36.0 35.5 35.0

6L TR IF 3 46 44 42 6L TR IF 4 46 44 42 7L HH IF 1

69.0 68.5 68.0 67.5

7L HH IF 2

Kelvin

69.0 68.5 68.0 67.5

7L HH IF 3 71 70 69 68 7L HH IF 4

TIME (HOURS)

19 00 30 20 00 30 21 00

71 70 69 68