Center at RA 02 37 52.40568 DEC 28 48 08.9901

CONT: 0234+285 IPOL 5034.521 MHZ 0234+285.IIM001.2

PLot file version 1 created 30-MAR-2004 13:21:14

Cont peak flux = 1.9393E+00 JY/BEAM Levs = 1.939E+00 * (-0.278, 0.278, 0.557)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100