Gain amp vs UTC time for 3C454.3.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 1 created 30-MAR-2004 13:23:26

1 EF IF 1R 1.4 1.2 1.0 1 EF IF 1L 1.4 1.2 1.0 1 EF IF 2R 1.2 1.1 1.0 0.9 1 EF IF 2L 1.1 1.0 0.9 0.8 1 EF IF 3R

1.10 1.05 1.00 0.95 1 EF IF 3L

Gain

1.1 1.0 0.9 0.8 1 EF IF 4R 1.1 1.0 0.9 1 EF IF 4L 1.1 1.0 0.9 0.8 1 EF IF 5R 1.1 1.0 0.9 1 EF IF 5L

TIME (HOURS)

11 00 05 10 15 20

1.2 1.1 1.0 0.9

Gain amp vs UTC time for 3C454.3.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 2 created 30-MAR-2004 13:23:26

1 EF IF 6R 1.3 1.2 1.1 1.0 0.9 1 EF IF 6L 1.3 1.2 1.1 1.0 0.9 1 EF IF 7R

1.340 1.335 1.330 1.325

1 EF IF 7L 1.8 1.6 1.4 1 EF IF 8R

1.725 1.720 1.715 1.710

1 EF IF 8L

Gain

0.5 0.4 0.3 0.2 0.1 2 WB IF 1R 1.1 1.0 0.9 0.8 2 WB IF 1L 1.1 1.0 0.9 0.8 2 WB IF 2R 1.2 1.1 1.0 2 WB IF 2L

TIME (HOURS)

11 00 05 10 15 20

1.4 1.2 1.0 0.8

Gain amp vs UTC time for 3C454.3.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 3 created 30-MAR-2004 13:23:26

2 WB IF 3R 1.0 0.9 0.8 0.7 2 WB IF 3L 1.1 1.0 0.9 0.8 0.7 2 WB IF 4R 1.0 0.9 0.8 0.7 2 WB IF 4L 1.1 1.0 0.9 0.8 0.7 2 WB IF 5R 1.0 0.9 0.8 0.7 2 WB IF 5L

Gain

1.0 0.9 0.8 0.7 2 WB IF 6R 1.0 0.9 0.8 0.7 2 WB IF 6L 1.0 0.9 0.8 0.7 4 CM IF 1L

1.56 1.55 1.54 1.53

4 CM IF 2R

TIME (HOURS)

11 00 05 10 15 20

1.415 1.410 1.405 1.400

Gain amp vs UTC time for 3C454.3.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 4 created 30-MAR-2004 13:23:26

4 CM IF 2L 1.4 1.2 1.0 6 MC IF 1R 2.0 1.8 1.6 1.4 6 MC IF 1L 2.2 2.0 1.8 1.6 1.4 1.2 6 MC IF 2R 2.4 2.2 2.0 1.8 1.6 1.4 6 MC IF 2L 2.5 2.0 1.5 1.0 6 MC IF 3R

Gain

2.0 1.5 6 MC IF 3L 2.5 2.0 1.5 1.0 6 MC IF 4R 2.5 2.0 1.5 6 MC IF 4L 3.0 2.5 2.0 1.5 6 MC IF 5R

TIME (HOURS)

11 00 05 10 15 20

2.5 2.0 1.5

Gain amp vs UTC time for 3C454.3.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 5 created 30-MAR-2004 13:23:26

6 MC IF 5L 2.5 2.0 1.5 6 MC IF 6R 2.5 2.0 1.5 6 MC IF 6L 2.5 2.0 1.5 6 MC IF 7R

1.860 1.855 1.850 1.845

6 MC IF 7L 1.7 1.6 1.5 6 MC IF 8R

Gain

1.570 1.565 1.560 1.555

6 MC IF 8L 0.8 0.6 0.4 0.2 7 NT IF 1R 1.4 1.2 1.0 0.8 7 NT IF 1L 1.0 0.8 0.6 7 NT IF 2R

TIME (HOURS)

11 00 05 10 15 20

1.4 1.2 1.0

Gain amp vs UTC time for 3C454.3.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 6 created 30-MAR-2004 13:23:26

7 NT IF 2L 1.2 1.0 0.8 7 NT IF 3R 1.0 0.9 0.8 7 NT IF 3L 1.2 1.0 0.8 7 NT IF 4R 1.0 0.9 0.8 7 NT IF 4L 1.2 1.1 1.0 0.9 7 NT IF 5R

Gain

0.8 0.7 0.6 7 NT IF 5L 1.0 0.9 0.8 0.7 7 NT IF 6R 0.9 0.8 0.7 0.6 0.5 7 NT IF 6L 1.2 1.0 0.8 7 NT IF 7R

TIME (HOURS)

11 00 05 10 15 20

9.560 9.555 9.550 9.545

Gain amp vs UTC time for 3C454.3.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 7 created 30-MAR-2004 13:23:26

7 NT IF 7L

18.830 18.825 18.820 18.815

7 NT IF 8R

1.065 1.060 1.055 1.050

7 NT IF 8L 1.6 1.5 1.4 1.3 8 TR IF 1R 0.9 0.8 0.7 0.6 8 TR IF 1L 0.8 0.7 0.6 0.5 8 TR IF 2R

Gain

0.9 0.8 0.7 8 TR IF 2L 0.9 0.8 0.7 8 TR IF 3R

0.90 0.85 0.80 0.75

8 TR IF 3L 0.9 0.8 0.7 8 TR IF 4R

TIME (HOURS)

11 00 05 10 15 20

0.90 0.85 0.80 0.75

Gain amp vs UTC time for 3C454.3.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 8 created 30-MAR-2004 13:23:26

8 TR IF 4L 0.9 0.8 0.7 8 TR IF 7R

0.265 0.260 0.255 0.250

8 TR IF 8R

0.680 0.675 0.670 0.665

9 UR IF 1L 0.9 0.8 0.7 0.6 9 UR IF 2L 1.0 0.9 0.8 9 UR IF 3L

Gain

1.3 1.2 1.1 1.0 0.9 9 UR IF 4L 1.2 1.0 0.8 9 UR IF 5L 1.1 1.0 0.9 0.8 0.7 9 UR IF 6L 1.0 0.8 0.6 9 UR IF 7L

TIME (HOURS)

11 00 05 10 15 20

0.55 0.50 0.45

Gain amp vs UTC time for 3C454.3.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 9 created 30-MAR-2004 13:23:26

9 UR IF 8L 2.2 2.0 1.8 1.6 1.4 10 SH IF 1L 1.2 1.0 0.8 10 SH IF 2L 1.1 1.0 0.9 10 SH IF 3L 1.6 1.4 1.2 1.0 0.8 10 SH IF 4L 1.6 1.4 1.2 1.0 0.8 10 SH IF 8L

Gain

5.535 5.530 5.525 5.520

11 HH IF 1R 1.8 1.6 1.4 1.2 1.0 11 HH IF 1L 1.6 1.4 1.2 1.0 11 HH IF 2R 1.1 1.0 0.9 11 HH IF 2L

TIME (HOURS)

11 00 05 10 15 20

1.25 1.20 1.15 1.10

Gain amp vs UTC time for 3C454.3.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 10 created 30-MAR-2004 13:23:26

11 HH IF 3R 1.2 1.1 1.0 0.9 11 HH IF 3L 1.2 1.1 1.0 0.9 11 HH IF 4R 1.8 1.6 1.4 1.2 1.0 0.8 11 HH IF 4L

Gain

TIME (HOURS)

11 00 05 10 15 20

1.8 1.6 1.4 1.2 1.0 0.8