Gain phs vs UTC time for 3C454.3.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 1 created 30-MAR-2004 13:23:08

1 EF IF 1R

0.010 0.005 0.000 -0.005

1 EF IF 1L

0.010 0.005 0.000 -0.005

1 EF IF 2R

0.010 0.005 0.000 -0.005

1 EF IF 2L

0.010 0.005 0.000 -0.005

1 EF IF 3R

0.010 0.005 0.000 -0.005

1 EF IF 3L

Degrees

0.010 0.005 0.000 -0.005

1 EF IF 4R

0.010 0.005 0.000 -0.005

1 EF IF 4L

0.010 0.005 0.000 -0.005

1 EF IF 5R

0.010 0.005 0.000 -0.005

1 EF IF 5L

TIME (HOURS)

11 00 05 10 15 20

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for 3C454.3.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 2 created 30-MAR-2004 13:23:08

1 EF IF 6R

0.010 0.005 0.000 -0.005

1 EF IF 6L

0.010 0.005 0.000 -0.005

1 EF IF 7R

0.010 0.005 0.000 -0.005

1 EF IF 7L

0.010 0.005 0.000 -0.005

1 EF IF 8R

0.010 0.005 0.000 -0.005

1 EF IF 8L

Degrees

0.010 0.005 0.000 -0.005

2 WB IF 1R -3 -4 -5 -6 -7 2 WB IF 1L -1 -2 -3 -4 2 WB IF 2R 3 2 1 0 2 WB IF 2L

TIME (HOURS)

11 00 05 10 15 20

2 1 0

Gain phs vs UTC time for 3C454.3.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 3 created 30-MAR-2004 13:23:08

2 WB IF 3R 2 1 0 -1 2 WB IF 3L 2 1 0 -1 2 WB IF 4R 2 1 0 -1 2 WB IF 4L 2 1 0 -1 2 WB IF 5R 1 0 -1 -2 2 WB IF 5L

Degrees

1 0 -1 -2 2 WB IF 6R 1 0 -1 -2 2 WB IF 6L 0 -1 -2 -3 4 CM IF 1R 345 340 335 330 4 CM IF 1L

TIME (HOURS)

11 00 05 10 15 20

-15 -20 -25 -30

Gain phs vs UTC time for 3C454.3.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 4 created 30-MAR-2004 13:23:08

4 CM IF 2R 40 35 30 4 CM IF 2L 28 26 24 22 20 18 6 MC IF 1R 0 -1 -2 6 MC IF 1L

359.5 359.0 358.5 358.0 357.5

6 MC IF 2R 3 2 1 0 6 MC IF 2L

Degrees

0.5 0.0 -0.5 -1.0 -1.5

6 MC IF 3R 3 2 1 0 6 MC IF 3L 2 0 -2 6 MC IF 4R 4 2 0 6 MC IF 4L

TIME (HOURS)

11 00 05 10 15 20

3 2 1 0 -1

Gain phs vs UTC time for 3C454.3.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 5 created 30-MAR-2004 13:23:08

6 MC IF 5R 5 4 3 6 MC IF 5L 5 4 3 2 1 6 MC IF 6R 5 4 3 6 MC IF 6L 4 3 2 1 6 MC IF 7R 4 3 2 6 MC IF 7L

Degrees

4 2 0 6 MC IF 8R 10 8 6 4 2 6 MC IF 8L 4 2 0 -2 7 NT IF 1R 0 -2 -4 -6 7 NT IF 1L

TIME (HOURS)

11 00 05 10 15 20

2 0 -2

Gain phs vs UTC time for 3C454.3.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 6 created 30-MAR-2004 13:23:08

7 NT IF 2R 1 0 -1 -2 -3 7 NT IF 2L 1 0 -1 -2 -3 7 NT IF 3R 8 6 4 2 0 -2 7 NT IF 3L 6 4 2 0 -2 7 NT IF 4R 6 4 2 0 -2 7 NT IF 4L

Degrees

4 2 0 -2 -4 7 NT IF 5R 10 5 0 7 NT IF 5L 6 4 2 0 -2 7 NT IF 6R 10 5 0 7 NT IF 6L

TIME (HOURS)

11 00 05 10 15 20

5 0

Gain phs vs UTC time for 3C454.3.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 7 created 30-MAR-2004 13:23:08

7 NT IF 7R 15 10 5 7 NT IF 7L 10 5 0 7 NT IF 8R 15 10 5 7 NT IF 8L 10 5 0 8 TR IF 1R 15 10 5 0 -5 8 TR IF 1L

Degrees

10 5 0 -5 8 TR IF 2R 15 10 5 0 -5 8 TR IF 2L 10 5 0 -5 8 TR IF 3R 20 10 0 8 TR IF 3L

TIME (HOURS)

11 00 05 10 15 20

10 5 0 -5

Gain phs vs UTC time for 3C454.3.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 8 created 30-MAR-2004 13:23:08

8 TR IF 4R 20 10 0 8 TR IF 4L 10 5 0 -5 8 TR IF 5R

22.785 22.780 22.775 22.770

8 TR IF 5L

24.2 24.0 23.8 23.6 23.4 23.2

8 TR IF 6L 22 21 20 8 TR IF 7R

Degrees

-4 -6 -8 -10 8 TR IF 7L

-11.035 -11.040 -11.045 -11.050

8 TR IF 8R -25 -30 -35 8 TR IF 8L -25 -30 -35 9 UR IF 1L

TIME (HOURS)

11 00 05 10 15 20

20 10 0 -10

Gain phs vs UTC time for 3C454.3.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 9 created 30-MAR-2004 13:23:08

9 UR IF 2L 15 10 5 0 -5 9 UR IF 3L 10 0 -10 9 UR IF 4L 20 10 0 -10 9 UR IF 5L 40 20 0 -20 9 UR IF 6L 20 0 -20 9 UR IF 7L

Degrees

20 0 -20 9 UR IF 8L 20 10 0 -10 10 SH IF 1L 15 10 5 0 -5 10 SH IF 2L 0 -2 -4 -6 10 SH IF 3L

TIME (HOURS)

11 00 05 10 15 20

15 10 5 0

Gain phs vs UTC time for 3C454.3.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 10 created 30-MAR-2004 13:23:08

10 SH IF 4L 10 0 -10 10 SH IF 5L

-121.645 -121.650 -121.655 -121.660

10 SH IF 8L

-36.830 -36.835 -36.840 -36.845

11 HH IF 1R 20 0 -20 -40 11 HH IF 1L 40 20 0 -20 -40 11 HH IF 2R

Degrees

10 0 -10 11 HH IF 2L 10 0 -10 11 HH IF 3R 10 0 -10 11 HH IF 3L 10 0 -10 11 HH IF 4R

TIME (HOURS)

11 00 05 10 15 20

10 0 -10 -20

Gain phs vs UTC time for 3C454.3.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 11 created 30-MAR-2004 13:23:08

11 HH IF 4L

Degrees

TIME (HOURS)

11 00 05 10 15 20

10 0 -10 -20