Delay vs UTC time for n04c1.UVAVG.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 1 created 30-MAR-2004 13:11:48

1 EF IF 1R 0.000

1 EF IF 1L 0.000

1 EF IF 2R 0.000

1 EF IF 2L 0.000

1 EF IF 3R 0.000

1 EF IF 3L

MicroSeconds

0.000

1 EF IF 4R 0.000

1 EF IF 4L 0.000

1 EF IF 5R 0.000

1 EF IF 5L

TIME (HOURS)

11 00 30 12 00 30 13 00 30

0.000

Delay vs UTC time for n04c1.UVAVG.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 2 created 30-MAR-2004 13:11:48

1 EF IF 6R 0.000

1 EF IF 6L 0.000

1 EF IF 7R 0.000

1 EF IF 7L 0.000

1 EF IF 8R 0.000

1 EF IF 8L

MicroSeconds

0.000

2 WB IF 1R

0.044

0.042

0.040

2 WB IF 1L

0.008

0.007

2 WB IF 2R 0.045

2 WB IF 2L

TIME (HOURS)

11 00 30 12 00 30 13 00 30

0.011

Delay vs UTC time for n04c1.UVAVG.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 3 created 30-MAR-2004 13:11:48

2 WB IF 3R 0.048

2 WB IF 3L

0.015

2 WB IF 4R 0.048

2 WB IF 4L

0.027

0.026 2 WB IF 5R

0.049

0.048 0.047 2 WB IF 5L

MicroSeconds

0.020 0.019 0.018 0.017 2 WB IF 6R

0.040

0.039 2 WB IF 6L

0.011

0.010

2 WB IF 8R

4 CM IF 1R

TIME (HOURS)

11 00 30 12 00 30 13 00 30

-0.92 -0.93 -0.94 -0.95

Delay vs UTC time for n04c1.UVAVG.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 4 created 30-MAR-2004 13:11:48

4 CM IF 1L

-0.970 -0.975 -0.980 4 CM IF 2R

-0.005 -0.010 -0.015 4 CM IF 2L

-0.050 -0.055 -0.060 -0.065 5 ON IF 1R

0.014 0.013 0.012 5 ON IF 1L

-0.007

-0.008

5 ON IF 2R

MicroSeconds

0.015

0.014

5 ON IF 2L

-0.007

-0.008 5 ON IF 3R

0.021

0.020 5 ON IF 3L

-0.001

-0.002 5 ON IF 4R

TIME (HOURS)

11 00 30 12 00 30 13 00 30

0.021

0.020

Delay vs UTC time for n04c1.UVAVG.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 5 created 30-MAR-2004 13:11:48

5 ON IF 4L

0.001

0.000

5 ON IF 5R

0.027

0.026

5 ON IF 5L

0.002

0.001

5 ON IF 6R

0.027

0.026

5 ON IF 6L

-0.002

-0.003

5 ON IF 7R

MicroSeconds

0.027 0.026 0.025 0.024 0.023

5 ON IF 7L

0.003 0.002 0.001

5 ON IF 8R

0.027 0.026 0.025 0.024

5 ON IF 8L

0.003 0.002 0.001 0.000

6 MC IF 1R

TIME (HOURS)

11 00 30 12 00 30 13 00 30

0.035

0.034

Delay vs UTC time for n04c1.UVAVG.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 6 created 30-MAR-2004 13:11:48

6 MC IF 1L

0.005

0.004

6 MC IF 2R

0.035

6 MC IF 2L 0.004

6 MC IF 3R 0.037

6 MC IF 3L

0.004

6 MC IF 4R

MicroSeconds

0.035

6 MC IF 4L

0.003

0.002

6 MC IF 5R

0.034

0.033

6 MC IF 5L -0.001

6 MC IF 6R

TIME (HOURS)

11 00 30 12 00 30 13 00 30

0.032

0.031

Delay vs UTC time for n04c1.UVAVG.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 7 created 30-MAR-2004 13:11:48

6 MC IF 6L -0.005

6 MC IF 7R

0.031 0.030 0.029 0.028

6 MC IF 7L

0.000

-0.001

6 MC IF 8R

0.032

0.031

6 MC IF 8L

0.003 0.002 0.001 0.000

7 NT IF 1R

MicroSeconds

0.033

0.032

0.031

7 NT IF 1L

-0.016

-0.017

-0.018

7 NT IF 2R

0.038

0.037

7 NT IF 2L -0.011

-0.012

7 NT IF 3R

TIME (HOURS)

11 00 30 12 00 30 13 00 30

0.036

Delay vs UTC time for n04c1.UVAVG.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 8 created 30-MAR-2004 13:11:48

7 NT IF 3L

0.005

0.004

7 NT IF 4R

0.034

0.033

0.032

7 NT IF 4L 0.010

7 NT IF 5R

0.041

0.040

7 NT IF 5L

0.003

0.002

7 NT IF 6R

MicroSeconds

0.044

7 NT IF 6L

0.005

0.004

0.003

7 NT IF 7R

0.040 0.039 0.038 0.037

7 NT IF 7L

0.012 0.010 0.008 0.006

7 NT IF 8R

TIME (HOURS)

11 00 30 12 00 30 13 00 30

0.038 0.037 0.036

Delay vs UTC time for n04c1.UVAVG.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 9 created 30-MAR-2004 13:11:48

7 NT IF 8L

0.009 0.008 0.007 0.006

8 TR IF 1R

0.036 0.034 0.032 0.030

8 TR IF 1L

-0.001 -0.002 -0.003 -0.004

8 TR IF 2R

0.034

0.032

0.030

8 TR IF 2L

-0.009 -0.010 -0.011

8 TR IF 3R

MicroSeconds

0.037 0.036 0.035 0.034 0.033

8 TR IF 3L

0.000

-0.002

-0.004

8 TR IF 4R

0.032 0.031 0.030 0.029

8 TR IF 4L

-0.009 -0.010 -0.011 -0.012

8 TR IF 5R

TIME (HOURS)

11 00 30 12 00 30 13 00 30

-0.002 -0.004 -0.006 -0.008

Delay vs UTC time for n04c1.UVAVG.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 10 created 30-MAR-2004 13:11:48

8 TR IF 5L

-0.036 -0.037 -0.038 -0.039

8 TR IF 6R

-0.004

-0.006

-0.008

8 TR IF 6L

-0.038 -0.039 -0.040 -0.041

8 TR IF 7R

0.008 0.007 0.006 0.005

8 TR IF 7L

-0.032 -0.034 -0.036

8 TR IF 8R

MicroSeconds

0.007 0.006 0.005 0.004

8 TR IF 8L

-0.030 -0.032 -0.034 -0.036

9 UR IF 1L

0.005 0.004 0.003 0.002 0.001

9 UR IF 2L

0.002 0.001 0.000 -0.001

9 UR IF 3L

TIME (HOURS)

11 00 30 12 00 30 13 00 30

-0.002 -0.003 -0.004 -0.005

Delay vs UTC time for n04c1.UVAVG.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 11 created 30-MAR-2004 13:11:48

9 UR IF 4L

0.000 -0.001 -0.002

9 UR IF 5L

0.000

-0.002

-0.004

9 UR IF 6L

0.006

0.004

0.002

9 UR IF 7L

0.007 0.006 0.005 0.004

9 UR IF 8L

0.006 0.004 0.002

10 SH IF 1L

MicroSeconds

0.005 0.000 -0.005 -0.010

10 SH IF 2L

0.000 -0.005 -0.010 -0.015

10 SH IF 3L

0.010 0.005 0.000 -0.005

10 SH IF 4L

0.010 0.005 0.000 -0.005

10 SH IF 5L

TIME (HOURS)

11 00 30 12 00 30 13 00 30

0.005 0.000 -0.005 -0.010

Delay vs UTC time for n04c1.UVAVG.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 12 created 30-MAR-2004 13:11:48

10 SH IF 6L

0.000 -0.005 -0.010

10 SH IF 7L

-0.005 -0.010 -0.015

10 SH IF 8L

0.005 0.000 -0.005

11 HH IF 1R

0.032 0.031 0.030 0.029

11 HH IF 1L

-0.003 -0.004 -0.005 -0.006

11 HH IF 2R

MicroSeconds

0.031 0.030 0.029

11 HH IF 2L

-0.003 -0.004 -0.005 -0.006

11 HH IF 3R

0.036 0.035 0.034

11 HH IF 3L

0.001 0.000 -0.001 -0.002

11 HH IF 4R

TIME (HOURS)

11 00 30 12 00 30 13 00 30

0.038 0.037 0.036 0.035