Center at RA 12 24 52.42194 DEC 03 30 50.2929

CONT: 1222+037 IPOL 4989.552 MHZ 1222+037.ICL001.5

PLot file version 1 created 10-DEC-2004 13:36:31

Cont peak flux = 7.5842E-01 JY/BEAM Levs = 7.584E-01 * (-0.006, 0.006, 0.013, 0.025, 0.051, 0.102, 0.204, 0.408, 0.816)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100