Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Lpol IF 1 - 16

Plot file version 1 created 29-MAR-2004 12:17:17

2L EF IF 1

0.88 0.86 0.84 0.82 0.80 0.78

2L EF IF 2

0.88 0.86 0.84 0.82 0.80

2L EF IF 3

0.88 0.86 0.84 0.82 0.80 0.78

2L EF IF 4

0.88 0.86 0.84 0.82 0.80

2L EF IF 5

0.90

0.85

0.80 2L EF IF 6

Gain

0.88 0.86 0.84 0.82 0.80

2L EF IF 7

0.90

0.85

0.80

2L EF IF 8

0.90

0.85

0.80 2L EF IF 9 16 15 14 13 2L EF IF 10

TIME (HOURS)

20 00 05 10 15 20 25 30 35 40 45

0.90

0.85

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Lpol IF 1 - 16

Plot file version 2 created 29-MAR-2004 12:17:17

2L EF IF 11

0.95

0.90

0.85 2L EF IF 12

0.95

0.90

0.85 2L EF IF 13

0.95

0.90

2L EF IF 14

1.00 0.95 0.90

2L EF IF 15

0.920 0.915 0.910 0.905 2L EF IF 16

Gain

1.00

0.95

0.90

4L ON IF 1

0.88 0.86 0.84 0.82 4L ON IF 2

0.94 0.92 0.90 0.88

4L ON IF 3

0.92 0.90 0.88 0.86 0.84 0.82 4L ON IF 4

TIME (HOURS)

20 00 05 10 15 20 25 30 35 40 45

0.82 0.80 0.78 0.76

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Lpol IF 1 - 16

Plot file version 3 created 29-MAR-2004 12:17:17

4L ON IF 5

0.82 0.80 0.78 0.76 4L ON IF 6

0.82 0.80 0.78 0.76

4L ON IF 7

0.80 0.78 0.76 0.74

4L ON IF 8

0.82 0.80 0.78 0.76 0.74

4L ON IF 9 1.0 0.9 0.8 4L ON IF 10

Gain

0.80 0.78 0.76 0.74

4L ON IF 11

0.76 0.74 0.72 0.70

4L ON IF 12

0.84 0.82 0.80 0.78

4L ON IF 13

0.80 0.78 0.76 0.74 0.72 4L ON IF 14

TIME (HOURS)

20 00 05 10 15 20 25 30 35 40 45

0.82 0.80 0.78 0.76 0.74 0.72

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Lpol IF 1 - 16

Plot file version 4 created 29-MAR-2004 12:17:17

4L ON IF 15

0.605 0.600 0.595 0.590

4L ON IF 16

1.05

1.00

0.95

5L NT IF 1

1.05

1.00

0.95

5L NT IF 2

1.00 0.95 0.90

5L NT IF 3

0.98 0.96 0.94 0.92

5L NT IF 4

Gain

1.6 1.4 1.2 1.0 5L NT IF 5

1.05

1.00

5L NT IF 6

1.05

1.00

0.95

5L NT IF 7

1.10

1.05

1.00

5L NT IF 8

TIME (HOURS)

20 00 05 10 15 20 25 30 35 40 45

1.4 1.2 1.0

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Lpol IF 1 - 16

Plot file version 5 created 29-MAR-2004 12:17:17

5L NT IF 9 1.6 1.4 1.2 1.0 5L NT IF 10 1.8 1.6 1.4 1.2 1.0 5L NT IF 11 1.2 1.1 1.0 5L NT IF 12

1.15 1.10 1.05 1.00

5L NT IF 13 3 2 1 5L NT IF 14

Gain

1.3 1.2 1.1 5L NT IF 15

178.520 178.515 178.510 178.505

5L NT IF 16 1.3 1.2 1.1 1.0 0.9 6L CM IF 1 1.2 1.1 1.0 0.9 6L CM IF 2

TIME (HOURS)

20 00 05 10 15 20 25 30 35 40 45

10.815 10.810 10.805 10.800

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Lpol IF 1 - 16

Plot file version 6 created 29-MAR-2004 12:17:17

8L SH IF 1 1.3 1.2 1.1 1.0 8L SH IF 2 1.5 1.4 1.3 1.2 1.1 8L SH IF 3 1.4 1.2 1.0 8L SH IF 4 1.4 1.2 1.0 8L SH IF 5 1.4 1.2 1.0 8L SH IF 6

Gain

1.4 1.2 1.0 8L SH IF 7 1.4 1.2 1.0 8L SH IF 8 1.4 1.2 1.0 8L SH IF 9 1.2 1.1 1.0 0.9 8L SH IF 10

TIME (HOURS)

20 00 05 10 15 20 25 30 35 40 45

1.4 1.2 1.0 0.8

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Lpol IF 1 - 16

Plot file version 7 created 29-MAR-2004 12:17:17

8L SH IF 11 1.6 1.4 1.2 1.0 8L SH IF 12 2.0 1.8 1.6 1.4 1.2 8L SH IF 13 1.6 1.4 1.2 1.0 0.8 8L SH IF 14 1.6 1.4 1.2 1.0 8L SH IF 15

2.300 2.295 2.290 2.285

8L SH IF 16

Gain

1.05 1.00 0.95 0.90

9L MH IF 1

1.12 1.10 1.08 1.06 1.04 1.02

9L MH IF 2 1.4 1.3 1.2 9L MH IF 3

1.15 1.10 1.05 1.00 0.95

9L MH IF 4

TIME (HOURS)

20 00 05 10 15 20 25 30 35 40 45

1.20 1.15 1.10 1.05

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Lpol IF 1 - 16

Plot file version 8 created 29-MAR-2004 12:17:17

9L MH IF 5

1.18 1.16 1.14 1.12 1.10 1.08

9L MH IF 6

1.20 1.15 1.10

9L MH IF 7

1.30 1.25 1.20 1.15

9L MH IF 8

Gain

TIME (HOURS)

20 00 05 10 15 20 25 30 35 40 45

1.35 1.30 1.25 1.20