Gain amp vs UTC time for CEPA.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 1 created 03-DEC-2004 18:57:45

1 EF IF 1L

8.670 8.665 8.660 8.655

1 EF IF 3R 1.6 1.4 1.2 1.0 1 EF IF 3L 1.6 1.4 1.2 1.0 0.8 0.6 2 MC IF 1L

2.125 2.120 2.115 2.110

2 MC IF 3R

0.48 0.46 0.44

2 MC IF 3L

Gain

4.410 4.405 4.400 4.395 4 ON IF 1L

3.620 3.615 3.610 3.605

4 ON IF 3L

0.595

0.590 0.585

5 NT IF 3R

0.975 0.970 0.965 0.960

6 CM IF 3R

TIME (HOURS)

1/03 30 35 40 45 50

2.0 1.5 1.0

Gain amp vs UTC time for CEPA.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 2 created 03-DEC-2004 18:57:45

6 CM IF 3L 2.0 1.5 1.0 0.5 9 MH IF 3R 1.2 1.0 0.8 9 MH IF 3L

Gain

TIME (HOURS)

1/03 30 35 40 45 50

1.4 1.2 1.0 0.8