Gain phs vs UTC time for CEPA.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 1 created 03-DEC-2004 18:57:22

1 EF IF 1R

0.010 0.005 0.000 -0.005

1 EF IF 1L

0.010 0.005 0.000 -0.005

1 EF IF 3R

0.010 0.005 0.000 -0.005

1 EF IF 3L

0.010 0.005 0.000 -0.005

1 EF IF 4R

0.010 0.005 0.000 -0.005

1 EF IF 4L

Degrees

0.010 0.005 0.000 -0.005

2 MC IF 1R

90.475 90.470 90.465 90.460

2 MC IF 1L

-142.860 -142.865 -142.870 -142.875

2 MC IF 3R 8 6 4 2 MC IF 3L

TIME (HOURS)

1/03 30 35 40 45 50

80 60 40 20 0 -20

Gain phs vs UTC time for CEPA.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 2 created 03-DEC-2004 18:57:22

2 MC IF 4R

-137.310 -137.315 -137.320 -137.325

2 MC IF 4L

127.865 127.860 127.855 127.850

4 ON IF 1L

102.310 102.305 102.300 102.295

4 ON IF 2L

-67.780 -67.785 -67.790 -67.795 4 ON IF 3R 30 20 10 0 -10 4 ON IF 3L

Degrees

20 0 -20 -40 -60 -80 4 ON IF 4R

42.800 42.795 42.790 42.785 4 ON IF 4L

144.680 144.675 144.670 144.665

5 NT IF 2L

-15.780 -15.785 -15.790 -15.795 5 NT IF 3R

TIME (HOURS)

1/03 30 35 40 45 50

-24.610 -24.615 -24.620 -24.625

Gain phs vs UTC time for CEPA.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 3 created 03-DEC-2004 18:57:22

5 NT IF 3L 20 0 -20 6 CM IF 1R

163.065 163.060 163.055 163.050 6 CM IF 2R

-4.795 -4.800 -4.805 -4.810

6 CM IF 3R 100 0 -100 -200

6 CM IF 3L 30 20 10 0 -10 7 UR IF 2L

Degrees

-40.960 -40.965 -40.970 -40.975

8 SH IF 1L

-40.955 -40.960 -40.965 -40.970

8 SH IF 3R

87.180 87.175 87.170 87.165

9 MH IF 2L

-99.450 -99.455 -99.460 -99.465

9 MH IF 3R

TIME (HOURS)

1/03 30 35 40 45 50

0 -20 -40 -60 -80

Gain phs vs UTC time for CEPA.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 4 created 03-DEC-2004 18:57:22

9 MH IF 3L

Degrees

TIME (HOURS)

1/03 30 35 40 45 50

5 0 -5 -10 -15