Center at RA 08 54 48.87492 DEC 20 06 30.6409

CONT: OJ287 IPOL 22234.443 MHZ OJ287.ICL001.5

PLot file version 1 created 08-DEC-2004 18:26:31

Cont peak flux = 1.8383E+00 JY/BEAM Levs = 1.838E+00 * (-0.016, 0.016, 0.031, 0.063, 0.126, 0.252, 0.503)

MilliARC SEC

MilliARC SEC

40 30 20 10 0 -10 -20 -30 -40

40

30

20

10

0

-10

-20

-30

-40