Center at RA 08 54 48.87492 DEC 20 06 30.6409

CONT: OJ287 IPOL 22234.443 MHZ OJ287.IIM001.2

PLot file version 1 created 08-DEC-2004 18:20:46

Cont peak flux = 1.7328E+00 JY/BEAM Levs = 1.733E+00 * (-0.115, 0.115, 0.231, 0.461, 0.922)

MilliARC SEC

MilliARC SEC

40 30 20 10 0 -10 -20 -30 -40

40

30

20

10

0

-10

-20

-30

-40