Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 1 created 21-APR-2004 16:03:14

1 EF IF 1R

1.05 1.00 0.95

1 EF IF 1L

0.94 0.92 0.90 0.88 0.86 0.84 1 EF IF 2R

0.95 0.90 0.85 1 EF IF 2L

0.90 0.85 0.80 1 EF IF 3R

0.90 0.85 0.80 1 EF IF 3L

Gain

0.90 0.85 0.80 1 EF IF 4R

0.92 0.90 0.88 0.86 1 EF IF 4L

0.90 0.85 0.80 1 EF IF 5R

1.00 0.95 0.90 1 EF IF 5L

TIME (HOURS)

19 00 10 20 30 40 50 20 00

1.00 0.95 0.90

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 2 created 21-APR-2004 16:03:14

1 EF IF 6R

1.15 1.10 1.05 1.00 0.95 1 EF IF 6L

1.00

0.95

0.90 1 EF IF 7R

0.95

0.90

0.85 1 EF IF 7L

0.90 0.88 0.86 0.84

1 EF IF 8R 2.5 2.0 1.5 1.0 1 EF IF 8L

Gain

0.96 0.94 0.92

2 WB IF 1R 1.2 1.1 1.0 0.9 2 WB IF 1L 1.2 1.0 0.8 2 WB IF 2R 1.1 1.0 0.9 2 WB IF 2L

TIME (HOURS)

19 00 10 20 30 40 50 20 00

1.1 1.0 0.9

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 3 created 21-APR-2004 16:03:14

2 WB IF 3R 1.1 1.0 0.9 2 WB IF 3L 1.1 1.0 0.9 2 WB IF 4R

1.08 1.06 1.04 1.02 1.00

2 WB IF 4L 1.3 1.2 1.1 1.0 2 WB IF 5R

1.15 1.10 1.05 1.00

2 WB IF 5L

Gain

1.10

1.05

1.00

2 WB IF 6R 4.5 4.0 3.5 3.0 2.5 2 WB IF 6L 4.5 4.0 3.5 3.0 2.5 2 WB IF 7R

1.00

0.95

0.90 2 WB IF 7L

TIME (HOURS)

19 00 10 20 30 40 50 20 00

0.94 0.92 0.90 0.88

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 4 created 21-APR-2004 16:03:14

2 WB IF 8R

202.400 202.395 202.390 202.385

4 CM IF 4R 6 5 4 3 4 CM IF 4L 3.5 3.0 2.5 2.0 5 ON IF 1R

1.00 0.95 0.90

5 ON IF 1L

1.20 1.15 1.10

5 ON IF 2R

Gain

1.05 1.00 0.95 0.90 0.85

5 ON IF 2L

1.05 1.00 0.95 0.90 0.85

5 ON IF 3R 1.3 1.2 1.1 1.0 0.9 5 ON IF 3L 2.0 1.5 1.0 5 ON IF 4R

TIME (HOURS)

19 00 10 20 30 40 50 20 00

1.0 0.8 0.6

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 5 created 21-APR-2004 16:03:14

5 ON IF 4L 1.1 1.0 0.9 0.8 5 ON IF 5R

1.00 0.95 0.90 0.85

5 ON IF 5L

1.15 1.10 1.05 1.00

5 ON IF 6R 1.0 0.9 0.8 5 ON IF 6L

1.15 1.10 1.05

5 ON IF 7R

1.15 1.10 1.05 1.00 0.95

5 ON IF 7L

1.20

1.15

5 ON IF 8R

1.05 1.00 0.95 0.90

5 ON IF 8L

1.15 1.10 1.05 1.00

6 MC IF 1R

TIME (HOURS)

19 00 10 20 30 40 50 20 00

10 9 8

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 6 created 21-APR-2004 16:03:14

6 MC IF 1L 8 7 6 6 MC IF 2R 1.5 1.4 1.3 1.2 6 MC IF 2L 1.2 1.1 1.0 6 MC IF 3R

0.95 0.90 0.85 0.80

6 MC IF 3L

0.85 0.80 0.75

6 MC IF 4R 1.1 1.0 0.9 6 MC IF 4L 1.0 0.9 0.8 0.7 6 MC IF 5R

0.75 0.70 0.65 0.60 0.55

6 MC IF 5L 0.8 0.6 0.4 6 MC IF 6R

TIME (HOURS)

19 00 10 20 30 40 50 20 00

0.9 0.8 0.7

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 7 created 21-APR-2004 16:03:14

6 MC IF 6L 1.1 1.0 0.9 0.8 0.7 6 MC IF 7R 4 3 2 6 MC IF 8R 2.0 1.5 1.0 0.5 7 NT IF 1R

0.90

0.85

0.80

7 NT IF 1L 2.5 2.0 1.5 1.0 7 NT IF 2R

1.00 0.95 0.90

7 NT IF 2L

0.95 0.90 0.85

7 NT IF 3R

1.00 0.95 0.90 0.85

7 NT IF 3L

1.15 1.10 1.05 1.00 0.95

7 NT IF 4R

TIME (HOURS)

19 00 10 20 30 40 50 20 00

1.2 1.1 1.0 0.9

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 8 created 21-APR-2004 16:03:14

7 NT IF 4L 1.4 1.2 1.0 7 NT IF 5R

0.96 0.94 0.92

7 NT IF 5L

0.95 0.90 0.85

7 NT IF 6R

0.85 0.80 0.75

7 NT IF 6L

0.90 0.85 0.80 0.75

7 NT IF 7R

1.10 1.05 1.00 0.95

7 NT IF 7L

1.10 1.05 1.00 0.95

7 NT IF 8R 0.8 0.7 0.6 7 NT IF 8L

1.05 1.00 0.95 0.90 0.85

8 TR IF 1R

TIME (HOURS)

19 00 10 20 30 40 50 20 00

0.4 0.2 0.0

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 9 created 21-APR-2004 16:03:14

8 TR IF 1L 0.3 0.2 0.1 0.0 8 TR IF 2R 0.4 0.2 0.0 8 TR IF 2L 0.3 0.2 0.1 0.0 8 TR IF 3R 0.6 0.4 0.2 0.0 8 TR IF 3L

0.20 0.15 0.10 0.05

8 TR IF 4R 0.4 0.2 0.0 8 TR IF 4L 0.2 0.1 0.0 8 TR IF 5R 0.4 0.2 0.0 8 TR IF 5L 0.4 0.2 0.0 8 TR IF 6R

TIME (HOURS)

19 00 10 20 30 40 50 20 00

0.8 0.6 0.4 0.2 0.0

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 10 created 21-APR-2004 16:03:14

8 TR IF 6L 0.4 0.2 0.0 8 TR IF 7R 0.4 0.3 0.2 0.1 8 TR IF 7L 0.6 0.4 0.2 0.0 8 TR IF 8R 1.0 0.5 0.0 8 TR IF 8L 0.4 0.2 0.0 9 UR IF 1R

49.550 49.545 49.540 49.535

9 UR IF 1L

0.90

0.85

0.80

9 UR IF 2R 1.2 1.1 1.0 9 UR IF 2L 1.0 0.9 0.8 9 UR IF 3R

TIME (HOURS)

19 00 10 20 30 40 50 20 00

1.05

1.00

0.95

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 11 created 21-APR-2004 16:03:14

9 UR IF 3L

1.00

0.95

0.90

9 UR IF 4R

1.05 1.00 0.95 0.90

9 UR IF 4L

0.95 0.90 0.85 0.80

9 UR IF 5R

5.050 5.045 5.040 5.035

9 UR IF 5L

0.810 0.805 0.800 0.795

9 UR IF 6R

0.92 0.91 0.90 0.89

9 UR IF 6L

0.90

0.85

0.80

9 UR IF 7R 1.8 1.6 1.4 1.2 1.0 0.8 9 UR IF 7L

0.84 0.82 0.80 0.78

9 UR IF 8R

TIME (HOURS)

19 00 10 20 30 40 50 20 00

12.390 12.385 12.380 12.375

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 12 created 21-APR-2004 16:03:14

9 UR IF 8L

15.705 15.700 15.695 15.690

10 HH IF 1R

1.10 1.05 1.00 0.95

10 HH IF 1L

1.15 1.10 1.05 1.00

10 HH IF 2R

1.05 1.00 0.95 0.90 0.85

10 HH IF 2L

190.195 190.190 190.185 190.180

10 HH IF 3R

1.05 1.00 0.95 0.90 0.85

10 HH IF 3L 1.1 1.0 0.9 10 HH IF 4R

1.05 1.00 0.95

10 HH IF 4L 1.1 1.0 0.9 10 HH IF 5R

TIME (HOURS)

19 00 10 20 30 40 50 20 00

2.0 1.5 1.0

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 1 created 22-APR-2004 09:08:29

1 EF IF 1R

1.05 1.00 0.95

1 EF IF 1L

0.92 0.90 0.88 0.86

1 EF IF 2R

0.95

0.90

0.85 1 EF IF 2L

0.90

0.85

0.80 1 EF IF 3R

0.90

0.85

0.80 1 EF IF 3L

Gain

0.90 0.85

0.80 1 EF IF 4R

0.92 0.90 0.88 0.86 0.84 1 EF IF 4L

0.90

0.85

0.80 1 EF IF 5R

1.00 0.95 0.90

1 EF IF 5L

TIME (HOURS)

19 00 10 20 30 40 50 20 00

1.00 0.95 0.90

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 2 created 22-APR-2004 09:08:29

1 EF IF 6R

1.15 1.10 1.05 1.00 0.95 1 EF IF 6L

1.00

0.95

0.90 1 EF IF 7R

0.95

0.90

0.85 1 EF IF 7L

0.88 0.86 0.84 0.82 1 EF IF 8R 2.5 2.0 1.5 1.0 1 EF IF 8L

Gain

0.96 0.94 0.92 0.90

2 WB IF 1R 1.2 1.1 1.0 0.9 2 WB IF 1L 1.2 1.0 0.8 2 WB IF 2R 1.1 1.0 0.9 2 WB IF 2L

TIME (HOURS)

19 00 10 20 30 40 50 20 00

1.1 1.0 0.9

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 3 created 22-APR-2004 09:08:29

2 WB IF 3R 1.1 1.0 0.9 2 WB IF 3L 1.1 1.0 0.9 2 WB IF 4R

1.06 1.04 1.02 1.00 0.98 2 WB IF 4L 1.2 1.1 1.0 2 WB IF 5R

1.15 1.10 1.05 1.00 0.95 2 WB IF 5L

Gain

1.05

1.00

0.95

2 WB IF 6R 4.5 4.0 3.5 3.0 2.5 2 WB IF 6L 4.5 4.0 3.5 3.0 2.5 2 WB IF 7R

0.96 0.94 0.92 0.90 0.88

2 WB IF 7L

TIME (HOURS)

19 00 10 20 30 40 50 20 00

0.94 0.92 0.90 0.88 0.86

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 4 created 22-APR-2004 09:08:29

2 WB IF 8R

200.930 200.925 200.920 200.915

4 CM IF 4R 6 5 4 3 4 CM IF 4L 4 3 2 5 ON IF 1R

1.05 1.00 0.95 0.90

5 ON IF 1L

1.20 1.15 1.10

5 ON IF 2R

Gain

1.00 0.95 0.90

5 ON IF 2L

1.05 1.00 0.95 0.90

5 ON IF 3R 1.3 1.2 1.1 1.0 0.9 5 ON IF 3L 2.0 1.5 1.0 5 ON IF 4R

TIME (HOURS)

19 00 10 20 30 40 50 20 00

1.0 0.8 0.6

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 5 created 22-APR-2004 09:08:29

5 ON IF 4L 1.2 1.0 0.8 5 ON IF 5R

1.05 1.00 0.95 0.90 0.85

5 ON IF 5L

1.15 1.10 1.05 1.00

5 ON IF 6R 1.0 0.9 0.8 5 ON IF 6L

1.10 1.05 1.00

5 ON IF 7R 1.1 1.0 0.9 5 ON IF 7L

1.20 1.15 1.10

5 ON IF 8R

1.00 0.95 0.90 0.85

5 ON IF 8L

1.15 1.10 1.05 1.00

6 MC IF 1R

TIME (HOURS)

19 00 10 20 30 40 50 20 00

10 9 8

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 6 created 22-APR-2004 09:08:29

6 MC IF 1L 8 7 6 6 MC IF 2R 1.6 1.5 1.4 1.3 6 MC IF 2L

1.25 1.20 1.15 1.10 1.05

6 MC IF 3R 1.0 0.9 0.8 6 MC IF 3L

0.90 0.85 0.80 0.75

6 MC IF 4R 1.1 1.0 0.9 6 MC IF 4L 1.1 1.0 0.9 0.8 0.7 6 MC IF 5R

0.75 0.70 0.65 0.60

6 MC IF 5L 0.8 0.6 0.4 6 MC IF 6R

TIME (HOURS)

19 00 10 20 30 40 50 20 00

1.0 0.9 0.8 0.7

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 7 created 22-APR-2004 09:08:29

6 MC IF 6L 1.1 1.0 0.9 0.8 0.7 6 MC IF 7R 4 3 2 6 MC IF 8R 2.0 1.5 1.0 0.5 7 NT IF 1R

0.90 0.85 0.80 0.75

7 NT IF 1L

0.80

0.75

0.70

7 NT IF 2R

1.00 0.95 0.90 0.85

7 NT IF 2L

0.95 0.90 0.85

7 NT IF 3R

1.00 0.95 0.90 0.85

7 NT IF 3L

1.15 1.10 1.05 1.00 0.95

7 NT IF 4R

TIME (HOURS)

19 00 10 20 30 40 50 20 00

1.2 1.1 1.0 0.9

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 8 created 22-APR-2004 09:08:29

7 NT IF 4L 1.4 1.2 1.0 7 NT IF 5R

1.00 0.98 0.96 0.94 0.92

7 NT IF 5L

1.00 0.95 0.90 0.85

7 NT IF 6R

0.85

0.80

0.75

7 NT IF 6L

0.95 0.90 0.85 0.80

7 NT IF 7R

1.10 1.05 1.00

7 NT IF 7L

1.10 1.05 1.00

7 NT IF 8R

0.85 0.80 0.75 0.70 0.65

7 NT IF 8L

1.05 1.00 0.95 0.90

8 TR IF 1R

TIME (HOURS)

19 00 10 20 30 40 50 20 00

0.4 0.2 0.0

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 9 created 22-APR-2004 09:08:29

8 TR IF 1L 0.3 0.2 0.1 0.0 8 TR IF 2R 0.4 0.2 0.0 8 TR IF 2L 0.3 0.2 0.1 0.0 8 TR IF 3R 0.6 0.4 0.2 0.0 8 TR IF 3L

0.20 0.15 0.10 0.05

8 TR IF 4R 0.4 0.2 0.0 8 TR IF 4L 0.2 0.1 0.0 8 TR IF 5R 0.4 0.2 0.0 8 TR IF 5L 0.4 0.2 0.0 8 TR IF 6R

TIME (HOURS)

19 00 10 20 30 40 50 20 00

0.8 0.6 0.4 0.2 0.0

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 10 created 22-APR-2004 09:08:29

8 TR IF 6L 0.4 0.2 0.0 8 TR IF 7R 0.4 0.3 0.2 0.1 8 TR IF 7L 0.6 0.4 0.2 0.0 8 TR IF 8R 1.0 0.5 0.0 8 TR IF 8L 0.4 0.2 0.0 9 UR IF 1R

49.010 49.005 49.000 48.995

9 UR IF 1L

0.95 0.90 0.85 0.80

9 UR IF 2R 1.2 1.1 1.0 9 UR IF 2L

1.00 0.95 0.90 0.85

9 UR IF 3R

TIME (HOURS)

19 00 10 20 30 40 50 20 00

1.05

1.00

0.95

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 11 created 22-APR-2004 09:08:29

9 UR IF 3L

1.00

0.95

0.90

9 UR IF 4R

1.00 0.95 0.90 0.85

9 UR IF 4L

0.95 0.90 0.85 0.80

9 UR IF 5R

4.985 4.980 4.975 4.970

9 UR IF 5L

0.81

0.80

0.79

9 UR IF 6R

0.91 0.90 0.89 0.88 0.87

9 UR IF 6L

0.90

0.85

0.80

9 UR IF 7R 2.0 1.5 1.0 9 UR IF 7L

0.84 0.82 0.80 0.78

9 UR IF 8R

TIME (HOURS)

19 00 10 20 30 40 50 20 00

12.565 12.560 12.555 12.550

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 12 created 22-APR-2004 09:08:29

9 UR IF 8L

15.930 15.925 15.920 15.915

10 HH IF 1R

1.05 1.00 0.95

10 HH IF 1L

1.10 1.05 1.00

10 HH IF 2R 1.1 1.0 0.9 10 HH IF 2L

199.805 199.800 199.795 199.790

10 HH IF 3R 1.1 1.0 0.9 10 HH IF 3L 1.1 1.0 0.9 10 HH IF 4R

1.05 1.00 0.95 0.90

10 HH IF 4L 1.1 1.0 0.9 10 HH IF 5R

TIME (HOURS)

19 00 10 20 30 40 50 20 00

2.0 1.5 1.0

Gain amp vs UTC time for 0851+202.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 13 created 22-APR-2004 09:08:29

10 HH IF 5L

0.90

0.85

0.80

10 HH IF 6R

0.96 0.94 0.92 0.90 0.88

10 HH IF 6L

0.95

0.90

0.85

10 HH IF 7R

1.00 0.95 0.90 0.85

10 HH IF 7L

0.95 0.90 0.85 0.80

10 HH IF 8R

0.98 0.96 0.94 0.92 0.90 0.88

10 HH IF 8L

0.92 0.90 0.88 0.86

12 SH IF 1R 1.5 1.4 1.3 1.2 1.1 12 SH IF 1L 1.8 1.6 1.4 1.2 12 SH IF 2R

TIME (HOURS)

19 00 10 20 30 40 50 20 00

1.7 1.6 1.5 1.4