Center at RA 08 54 48.87492 DEC 20 06 30.6409

CONT: 0851+202 IPOL 1657.521 MHZ 0851+202.IIM001.1

PLot file version 1 created 21-APR-2004 16:02:19

Cont peak flux = -1.3503E+00 JY/BEAM Levs = 9.751E-01 * (-0.200, 0.200, 0.400, 0.800)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250

Center at RA 08 54 48.87492 DEC 20 06 30.6409

CONT: 0851+202 IPOL 1657.521 MHZ 0851+202.IIM001.1

PLot file version 1 created 22-APR-2004 09:07:45

Cont peak flux = -1.3730E+00 JY/BEAM Levs = 9.787E-01 * (-0.200, 0.200, 0.400, 0.800)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250