Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 1 created 09-DEC-2004 13:49:37

1 WB IF 1R 1.2 1.1 1.0 1 WB IF 1L 1.3 1.2 1.1 1.0 0.9 1 WB IF 2R 1.5 1.4 1.3 1.2 1.1 1 WB IF 2L 1.3 1.2 1.1 1 WB IF 3R

0.66 0.64 0.62 0.60 0.58 1 WB IF 3L

Gain

0.74

0.72

0.70

1 WB IF 4R

0.620

0.615

0.610 1 WB IF 4L

0.722 0.720 0.718 0.716 0.714 0.712

2 EF IF 1R 1.8 1.7 1.6 1.5 2 EF IF 1L

TIME (HOURS)

19 30 20 00 30 21 00 30 22 00

1.8 1.6 1.4

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 2 created 09-DEC-2004 13:49:37

2 EF IF 2R 1.5 1.4 1.3 1.2 2 EF IF 2L 1.6 1.4 1.2 2 EF IF 3R

0.57

0.56

0.55 2 EF IF 3L

0.50

0.45

0.40 2 EF IF 4R

0.60 0.58 0.56

2 EF IF 4L

Gain

0.50 0.48 0.46

3 MC IF 1R 1.4 1.3 1.2 1.1 3 MC IF 1L 1.4 1.2 1.0 3 MC IF 2R 1.6 1.4 1.2 3 MC IF 2L

TIME (HOURS)

19 30 20 00 30 21 00 30 22 00

1.5 1.4 1.3 1.2 1.1

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 3 created 09-DEC-2004 13:49:38

3 MC IF 3R

0.78

0.76

0.74 3 MC IF 4R

0.80

0.75

0.70

3 MC IF 4L

0.90 0.85 0.80 0.75 4 DA IF 1R 1.0 0.8 0.6 4 DA IF 1L 2.0 1.5 1.0 0.5 4 DA IF 2R

Gain

0.8 0.6 0.4 4 DA IF 2L 0.7 0.6 0.5 0.4 0.3 4 DA IF 3R

55.830 55.825 55.820 55.815 5 ON IF 1R 1.4 1.3 1.2 5 ON IF 1L

TIME (HOURS)

19 30 20 00 30 21 00 30 22 00

1.6 1.4 1.2

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 4 created 09-DEC-2004 13:49:38

5 ON IF 2R 1.7 1.6 1.5 1.4 1.3 5 ON IF 2L 1.7 1.6 1.5 1.4 5 ON IF 3R

0.81

0.80

0.79

5 ON IF 3L

0.86 0.84 0.82 0.80

5 ON IF 4R

0.75

0.74

0.73

5 ON IF 4L

Gain

0.83

0.82

0.81

6 CM IF 1R 1.2 1.0 0.8 0.6 0.4 6 CM IF 1L

0.315 0.310 0.305 0.300

6 CM IF 2R 0.8 0.6 0.4 0.2 6 CM IF 2L

TIME (HOURS)

19 30 20 00 30 21 00 30 22 00

0.28

0.26

0.24

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 5 created 09-DEC-2004 13:49:38

6 CM IF 3R 2.2 2.0 1.8 1.6 6 CM IF 3L

23.240 23.235 23.230 23.225

7 TR IF 1R 4.0 3.5 3.0 2.5 7 TR IF 1L 1.2 1.0 0.8 7 TR IF 2R 4.5 4.0 3.5 7 TR IF 2L

Gain

1.5 1.4 1.3 1.2 7 TR IF 3R 2.2 2.1 2.0 7 TR IF 3L 1.2 1.1 1.0 7 TR IF 4R 2.2 2.1 2.0 7 TR IF 4L

TIME (HOURS)

19 30 20 00 30 21 00 30 22 00

1.06 1.04 1.02 1.00 0.98

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 6 created 09-DEC-2004 13:49:38

8 HH IF 1R 3.0 2.5 2.0 1.5 8 HH IF 1L

2.530 2.525 2.520 2.515

8 HH IF 2R 3.0 2.5 2.0 1.5 8 HH IF 2L 2.5 2.0 1.5 8 HH IF 3R 1.6 1.4 1.2 1.0 8 HH IF 3L

Gain

1.8 1.6 1.4 1.2 8 HH IF 4R 1.6 1.4 1.2 1.0 8 HH IF 4L 1.8 1.6 1.4 1.2 9 NT IF 1R 2.5 2.0 1.5 9 NT IF 1L

TIME (HOURS)

19 30 20 00 30 21 00 30 22 00

2.5 2.0 1.5 1.0

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 7 created 09-DEC-2004 13:49:38

9 NT IF 2R 3.0 2.5 2.0 9 NT IF 2L 2.5 2.0 1.5 9 NT IF 3R 1.3 1.2 1.1 1.0 0.9 9 NT IF 3L

1.20 1.15 1.10

9 NT IF 4R 1.2 1.1 1.0 9 NT IF 4L

Gain

TIME (HOURS)

19 30 20 00 30 21 00 30 22 00

1.2 1.1 1.0