Tsys vs UTC time for n04m1_2.MSORT.1 TY 1 Rpol & Lpol IF 1 - 4

Plot file version 1 created 09-DEC-2004 14:44:09

1 WB IF 1R 94 93 92 91 1 WB IF 1L

71.5 71.0 70.5 70.0 69.5 1 WB IF 2R 94 93 92 91 1 WB IF 2L

71.5 71.0 70.5 70.0 69.5 1 WB IF 3R 89 88 87 86 85 1 WB IF 3L

Kelvin

69.0 68.5 68.0 67.5

1 WB IF 4R 89 88 87 86 85 1 WB IF 4L

69.0 68.5 68.0 67.5

2 EF IF 1R 65 60 55 50 2 EF IF 1L

TIME (HOURS)

18 00 10 20 30 40 50

75 70 65 60 55

Tsys vs UTC time for n04m1_2.MSORT.1 TY 1 Rpol & Lpol IF 1 - 4

Plot file version 2 created 09-DEC-2004 14:44:09

2 EF IF 2R 65 60 55 50 2 EF IF 2L 75 70 65 60 55 2 EF IF 3R 70 60 50 2 EF IF 3L 75 70 65 60 55 2 EF IF 4R 70 60 50 2 EF IF 4L

Kelvin

75 70 65 60 55 3 MC IF 1R

79.5 79.0 78.5 78.0 77.5

3 MC IF 1L 75 74 73 72 3 MC IF 2R

79.5 79.0 78.5 78.0 77.5

3 MC IF 2L

TIME (HOURS)

18 00 10 20 30 40 50

75 74 73 72

Tsys vs UTC time for n04m1_2.MSORT.1 TY 1 Rpol & Lpol IF 1 - 4

Plot file version 3 created 09-DEC-2004 14:44:09

3 MC IF 3R 84 82 80 3 MC IF 3L 74 72 70 3 MC IF 4R 84 82 80 3 MC IF 4L 74 72 70 4 DA IF 1R

1.005 1.000 0.995

4 DA IF 1L

Kelvin

1.005 1.000 0.995

4 DA IF 2R

1.005 1.000 0.995

4 DA IF 2L

1.005 1.000 0.995

4 DA IF 3R

1.005 1.000 0.995

4 DA IF 3L

TIME (HOURS)

18 00 10 20 30 40 50

1.005 1.000 0.995

Tsys vs UTC time for n04m1_2.MSORT.1 TY 1 Rpol & Lpol IF 1 - 4

Plot file version 4 created 09-DEC-2004 14:44:09

4 DA IF 4R

1.005 1.000 0.995

4 DA IF 4L

1.005 1.000 0.995

5 ON IF 1R 132 130 128 126 124 5 ON IF 1L 150 140 130 5 ON IF 2R 132 130 128 126 124 5 ON IF 2L

Kelvin

150 140 130 5 ON IF 3R 146 144 142 140 138 5 ON IF 3L 160 150 140 5 ON IF 4R 146 144 142 140 138 5 ON IF 4L

TIME (HOURS)

18 00 10 20 30 40 50

160 150 140

Tsys vs UTC time for n04m1_2.MSORT.1 TY 1 Rpol & Lpol IF 1 - 4

Plot file version 5 created 09-DEC-2004 14:44:09

6 CM IF 1R

1.005 1.000 0.995

6 CM IF 1L

1.005 1.000 0.995

6 CM IF 2R

1.005 1.000 0.995

6 CM IF 2L

1.005 1.000 0.995

6 CM IF 3R

1.005 1.000 0.995

6 CM IF 3L

Kelvin

1.005 1.000 0.995

6 CM IF 4R

1.005 1.000 0.995

6 CM IF 4L

1.005 1.000 0.995

7 TR IF 1R 21 20 19 18 17 7 TR IF 1L

TIME (HOURS)

18 00 10 20 30 40 50

64 62 60 58

Tsys vs UTC time for n04m1_2.MSORT.1 TY 1 Rpol & Lpol IF 1 - 4

Plot file version 6 created 09-DEC-2004 14:44:09

7 TR IF 2R 21 20 19 18 17 7 TR IF 2L 64 62 60 58 7 TR IF 3R 200 150 100 50 7 TR IF 3L 70 65 60 7 TR IF 4R 200 150 100 50 7 TR IF 4L

Kelvin

70 65 60 8 HH IF 1R

59.5 59.0 58.5 58.0 57.5

8 HH IF 1L

58.5 58.0 57.5 57.0 56.5

8 HH IF 2R

59.5 59.0 58.5 58.0 57.5

8 HH IF 2L

TIME (HOURS)

18 00 10 20 30 40 50

58.5 58.0 57.5 57.0 56.5

Tsys vs UTC time for n04m1_2.MSORT.1 TY 1 Rpol & Lpol IF 1 - 4

Plot file version 7 created 09-DEC-2004 14:44:09

8 HH IF 3R

54.0 53.5 53.0 52.5

8 HH IF 3L

54.0 53.5 53.0 52.5

8 HH IF 4R

54.0 53.5 53.0 52.5

8 HH IF 4L

Kelvin

TIME (HOURS)

18 00 10 20 30 40 50

54.0 53.5 53.0 52.5