Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 1 created 16-FEB-2005 15:47:09

1 WB IF 1L

1000 990 980 970 1 WB IF 2L

1030 1020 1010 1000 990 2 JB IF 1L

1000 990 980 970 2 JB IF 2L

1040

1020

1000 980 3 NT IF 1L

1020

1000 980 3 NT IF 2L

MilliGain

1000 950 900 4 UR IF 1L 980 960 940 920 900 880 4 UR IF 2L

TIME (HOURS)

02 11 12 13 14 15 16 17 18 19

1050

1000 950 900