Center at RA 03 19 48.16010 DEC 41 30 42.1031

CONT: 3C84 IPOL 326.521 MHZ 3C84.ICL001.5

PLot file version 1 created 16-FEB-2005 15:51:18

Cont peak flux = 4.1564E-01 JY/BEAM Levs = 4.156E-01 * (-0.100, 0.100, 0.201, 0.402, 0.803)

ARC SEC

ARC SEC

1.0 0.5 0.0 -0.5 -1.0

1.0

0.5

0.0

-0.5

-1.0