Gain amp vs UTC time for n04p1.TMP.1 CL 4 Rpol & Lpol IF 1 - 2

Plot file version 1 created 16-FEB-2005 15:54:35

1 WB IF 1L 13 12 11 1 WB IF 2L 14 13 12 11 2 JB IF 1L

11.5 11.4 11.3 11.2

2 JB IF 2L

11.8 11.6 11.4

3 NT IF 1L

32.5 32.0 31.5 31.0 3 NT IF 2L

Gain

32 30 28 4 UR IF 1L 56 54 52 4 UR IF 2L

TIME (HOURS)

02 03 04 05 06 07

60 58 56 54 52