Tsys vs UTC time for n04x1.UVAVG.1 TY 1 Rpol IF 1 - 16

Plot file version 1 created 29-MAR-2004 17:40:27

1R EF IF 1 29 28 27 26 1R EF IF 2 29 28 27 26 1R EF IF 3 28 27 26 25 1R EF IF 4 28 27 26 25 1R EF IF 5 28 27 26 25 1R EF IF 6

Kelvin

28 27 26 25 1R EF IF 7 27 26 25 24 1R EF IF 8 27 26 25 24 1R EF IF 9 26 25 24 23 1R EF IF 10

TIME (HOURS)

18 00 30 19 00 30 20 00

26 25 24 23

Tsys vs UTC time for n04x1.UVAVG.1 TY 1 Rpol IF 1 - 16

Plot file version 2 created 29-MAR-2004 17:40:27

1R EF IF 11 24 23 22 1R EF IF 12 24 23 22 1R EF IF 13 23 22 21 1R EF IF 14 23 22 21 1R EF IF 15 24 23 22 1R EF IF 16

Kelvin

24 23 22 2R WB IF 1 440 420 400 2R WB IF 2 440 420 400 2R WB IF 3 460 440 420 2R WB IF 4

TIME (HOURS)

18 00 30 19 00 30 20 00

460 440 420

Tsys vs UTC time for n04x1.UVAVG.1 TY 1 Rpol IF 1 - 16

Plot file version 3 created 29-MAR-2004 17:40:27

2R WB IF 5 460 440 420 400 2R WB IF 6 460 440 420 400 2R WB IF 7 460 440 420 2R WB IF 8 460 440 420 2R WB IF 9 500 480 460 440 420 2R WB IF 10

Kelvin

500 480 460 440 420 2R WB IF 11 520 500 480 460 2R WB IF 12 520 500 480 460 2R WB IF 13 540 520 500 480 2R WB IF 14

TIME (HOURS)

18 00 30 19 00 30 20 00

540 520 500 480

Tsys vs UTC time for n04x1.UVAVG.1 TY 1 Rpol IF 1 - 16

Plot file version 4 created 29-MAR-2004 17:40:27

2R WB IF 15 560 540 520 500 2R WB IF 16 560 540 520 500 3R ON IF 1 96 95 94 93 3R ON IF 2 96 95 94 93 3R ON IF 3 89 88 87 86 3R ON IF 4

Kelvin

89 88 87 86 3R ON IF 5 87 86 85 84 3R ON IF 6 87 86 85 84 3R ON IF 7 90 89 88 87 3R ON IF 8

TIME (HOURS)

18 00 30 19 00 30 20 00

90 89 88 87

Tsys vs UTC time for n04x1.UVAVG.1 TY 1 Rpol IF 1 - 16

Plot file version 5 created 29-MAR-2004 17:40:27

3R ON IF 9 88 87 86 85 3R ON IF 10 88 87 86 85 3R ON IF 11 86 85 84 3R ON IF 12 86 85 84 3R ON IF 13 88 87 86 3R ON IF 14

Kelvin

88 87 86 3R ON IF 15 86 84 82 3R ON IF 16 86 84 82 4R MC IF 1 40 39 38 4R MC IF 2

TIME (HOURS)

18 00 30 19 00 30 20 00

40 39 38

Tsys vs UTC time for n04x1.UVAVG.1 TY 1 Rpol IF 1 - 16

Plot file version 6 created 29-MAR-2004 17:40:27

4R MC IF 3

39.5 39.0 38.5 38.0 37.5

4R MC IF 4

39.5 39.0 38.5 38.0 37.5

4R MC IF 5 40 39 38 4R MC IF 6 40 39 38 4R MC IF 7

40.0 39.5 39.0 38.5

4R MC IF 8

Kelvin

40.0 39.5 39.0 38.5

4R MC IF 9 40 39 38 4R MC IF 10 40 39 38 4R MC IF 11

39.5 39.0 38.5 38.0

4R MC IF 12

TIME (HOURS)

18 00 30 19 00 30 20 00

39.5 39.0 38.5 38.0

Tsys vs UTC time for n04x1.UVAVG.1 TY 1 Rpol IF 1 - 16

Plot file version 7 created 29-MAR-2004 17:40:27

4R MC IF 13

39.5 39.0 38.5 38.0 37.5

4R MC IF 14

39.5 39.0 38.5 38.0 37.5

4R MC IF 15 38 37 36 4R MC IF 16 38 37 36 5R NT IF 1 131 130 129 128 127 5R NT IF 2

Kelvin

131 130 129 128 127 5R NT IF 3 120 115 110 5R NT IF 4 120 115 110 5R NT IF 5 125 120 115 110 5R NT IF 6

TIME (HOURS)

18 00 30 19 00 30 20 00

125 120 115 110

Tsys vs UTC time for n04x1.UVAVG.1 TY 1 Rpol IF 1 - 16

Plot file version 8 created 29-MAR-2004 17:40:27

5R NT IF 7 112 110 108 5R NT IF 8 112 110 108 5R NT IF 9 111 110 109 108 5R NT IF 10 111 110 109 108 5R NT IF 11 112 110 108 106 5R NT IF 12

Kelvin

112 110 108 106 5R NT IF 13 114 113 112 5R NT IF 14 114 113 112 5R NT IF 15 130 128 126 5R NT IF 16

TIME (HOURS)

18 00 30 19 00 30 20 00

130 128 126

Tsys vs UTC time for n04x1.UVAVG.1 TY 1 Rpol IF 1 - 16

Plot file version 9 created 29-MAR-2004 17:40:27

6R UR IF 1 148 146 144 142 6R UR IF 2 148 146 144 142 6R UR IF 3 91 90 89 88 6R UR IF 4 91 90 89 88 6R UR IF 5 75 74 73 72 6R UR IF 6

Kelvin

75 74 73 72 6R UR IF 7 102 101 100 99 6R UR IF 8 102 101 100 99 6R UR IF 9 106 104 102 6R UR IF 10

TIME (HOURS)

18 00 30 19 00 30 20 00

106 104 102

Tsys vs UTC time for n04x1.UVAVG.1 TY 1 Rpol IF 1 - 16

Plot file version 10 created 29-MAR-2004 17:40:27

6R UR IF 11 74 73 72 6R UR IF 12 74 73 72 6R UR IF 13 106 104 102 100 6R UR IF 14 106 104 102 100 6R UR IF 15 116 114 112 110 6R UR IF 16

Kelvin

116 114 112 110 7R SH IF 1 55 50 45 40 7R SH IF 2 55 50 45 40 7R SH IF 3 50 45 40 7R SH IF 4

TIME (HOURS)

18 00 30 19 00 30 20 00

50 45 40

Tsys vs UTC time for n04x1.UVAVG.1 TY 1 Rpol IF 1 - 16

Plot file version 11 created 29-MAR-2004 17:40:27

7R SH IF 5 60 55 50 7R SH IF 6 60 55 50 7R SH IF 7 60 55 50 7R SH IF 8 60 55 50 7R SH IF 9 55 50 45 7R SH IF 10

Kelvin

55 50 45 7R SH IF 11 55 50 7R SH IF 12 55 50 7R SH IF 13 58 56 54 52 50 48 7R SH IF 14

TIME (HOURS)

18 00 30 19 00 30 20 00

58 56 54 52 50 48

Tsys vs UTC time for n04x1.UVAVG.1 TY 1 Rpol IF 1 - 16

Plot file version 12 created 29-MAR-2004 17:40:27

7R SH IF 15 80 70 60 7R SH IF 16 80 70 60 8R HH IF 1 75 70 8R HH IF 2 75 70 8R HH IF 3 75 70 65 8R HH IF 4

Kelvin

75 70 65 8R HH IF 5 72 70 68 66 64 62 8R HH IF 6 72 70 68 66 64 62 8R HH IF 7 72 70 68 66 64 62 8R HH IF 8

TIME (HOURS)

18 00 30 19 00 30 20 00

72 70 68 66 64 62