Center at RA 09 16 48.90455 DEC 38 54 28.1466

CONT: J0916+38 IPOL 4989.552 MHZ J0916+3854.ICL001.5

PLot file version 1 created 07-APR-2005 12:31:37

Cont peak flux = 4.3673E-01 JY/BEAM Levs = 4.367E-01 * (-0.005, 0.005, 0.009, 0.019, 0.038, 0.076, 0.152, 0.303, 0.606)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100