Center at RA 16 40 29.63277 DEC 39 46 46.0285

CONT: J1640+39 IPOL 22234.303 MHZ J1640+3946.ICL001.5

PLot file version 1 created 10-MAY-2005 13:15:17

Cont peak flux = 6.9301E-02 JY/BEAM Levs = 6.930E-02 * (-0.055, 0.055, 0.111, 0.221, 0.443, 0.886)

MilliARC SEC

MilliARC SEC

40 30 20 10 0 -10 -20 -30 -40

40

30

20

10

0

-10

-20

-30

-40