Center at RA 01 28 08.06339 DEC 49 01 05.9858

CONT: J0128+49 IPOL 22234.303 MHZ J0128+4901.ICL001.5

PLot file version 1 created 10-MAY-2005 13:17:21

Cont peak flux = 8.8206E-02 JY/BEAM Levs = 8.821E-02 * (-0.068, 0.068, 0.136, 0.271, 0.543)

MilliARC SEC

MilliARC SEC

40 30 20 10 0 -10 -20 -30 -40

40

30

20

10

0

-10

-20

-30

-40