Center at RA 01 36 58.59481 DEC 47 51 29.1001

CONT: 0133+476 IPOL 22234.303 MHZ 0133+476.ICL001.5

PLot file version 1 created 10-MAY-2005 15:03:52

Cont peak flux = 1.2497E+00 JY/BEAM Levs = 1.250E+00 * (-0.016, 0.016, 0.032, 0.064, 0.128, 0.255, 0.511)

MilliARC SEC

MilliARC SEC

40 30 20 10 0 -10 -20 -30 -40

40

30

20

10

0

-10

-20

-30

-40