Center at RA 16 42 58.80997 DEC 39 48 36.9940

CONT: 3C345 IPOL 22234.443 MHZ 3C345.ICL001.3

PLot file version 1 created 15-FEB-2006 15:04:09

Cont peak flux = 9.5562E-01 JY/BEAM Levs = 9.556E-03 * (-2.33, 2.326, 4.651, 9.303, 18.61, 37.21, 74.42)

MilliARC SEC

MilliARC SEC

30 20 10 0 -10 -20 -30

30

20

10

0

-10

-20

-30