Center at RA 16 40 29.63277 DEC 39 46 46.0285

CONT: NRAO512 IPOL 22234.443 MHZ NRAO512.ICL001.1

PLot file version 1 created 15-FEB-2006 15:03:56

Cont peak flux = 6.7440E-02 JY/BEAM Levs = 6.744E-04 * (-35.4, 35.41, 70.82)

MilliARC SEC

MilliARC SEC

30 20 10 0 -10 -20 -30

30

20

10

0

-10

-20

-30