Center at RA 11 39 51.53872 DEC 76 54 32.3464

CONT: J1139+76 IPOL 1652.803 MHZ J1139+7654.ICL001.5

PLot file version 1 created 12-SEP-2005 14:05:00

Cont peak flux = 1.0353E-01 JY/BEAM Levs = 1.035E-01 * (-0.117, 0.117, 0.234, 0.468, 0.936)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250