Gain amp vs UTC time for J1406+7828.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 1 created 12-SEP-2005 14:02:27

1 JB IF 1R

0.865 0.860 0.855 0.850 1 JB IF 1L

0.875 0.870 0.865 0.860 1 JB IF 2R

0.780 0.775 0.770 0.765

1 JB IF 2L

0.950 0.945 0.940 0.935

1 JB IF 3R

0.785 0.780 0.775 0.770

1 JB IF 3L

Gain

0.750 0.745 0.740 0.735

1 JB IF 4R

0.815 0.810 0.805 0.800

1 JB IF 4L

0.780 0.775 0.770 0.765

2 WB IF 1R

1.15 1.10 1.05 1.00

2 WB IF 1L

TIME (HOURS)

23 15 16 17 18 19 20 21 22

0.98 0.96 0.94

Gain amp vs UTC time for J1406+7828.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 2 created 12-SEP-2005 14:02:27

2 WB IF 2R 1.1 1.0 0.9 2 WB IF 2L

0.96 0.95 0.94

2 WB IF 3R

0.94 0.92 0.90 0.88

2 WB IF 3L

0.95 0.90 0.85 0.80 0.75

2 WB IF 4R

1.06 1.04 1.02 1.00 0.98 2 WB IF 4L

Gain

1.15 1.10 1.05 1.00 0.95 4 ON IF 1R

0.885 0.880 0.875 0.870

4 ON IF 1L

0.945 0.940 0.935 0.930 4 ON IF 2R

1.055 1.050 1.045 1.040

4 ON IF 2L

TIME (HOURS)

23 15 16 17 18 19 20 21 22

1.090 1.085 1.080 1.075

Gain amp vs UTC time for J1406+7828.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 3 created 12-SEP-2005 14:02:27

4 ON IF 3R

1.185 1.180 1.175 1.170

4 ON IF 3L

1.225 1.220 1.215 1.210 4 ON IF 4R 1.1 1.0 0.9 0.8 4 ON IF 4L

1.115 1.110 1.105 1.100 6 TR IF 1R

1.05 1.00 0.95

6 TR IF 1L

Gain

1.00 0.98 0.96 0.94 0.92

6 TR IF 3R

1.15 1.10 1.05

6 TR IF 3L 1.1 1.0 0.9 0.8 6 TR IF 4R

1.05

1.00

0.95 6 TR IF 4L

TIME (HOURS)

23 15 16 17 18 19 20 21 22

1.2 1.1 1.0 0.9

Gain amp vs UTC time for J1406+7828.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 4 created 12-SEP-2005 14:02:27

8 SH IF 1L

0.860 0.855 0.850 0.845 8 SH IF 2R 1.0 0.8 0.6 0.4 8 SH IF 2L

3.455 3.450 3.445 3.440

8 SH IF 3L

4.200 4.195 4.190 4.185

9 UR IF 1R 0.8 0.6 0.4 0.2 9 UR IF 1L

Gain

0.780 0.775 0.770 0.765

9 UR IF 2R

1.055 1.050 1.045 1.040

9 UR IF 2L

1.010 1.005 1.000 0.995 9 UR IF 3R

1.10 1.08 1.06

9 UR IF 3L

TIME (HOURS)

23 15 16 17 18 19 20 21 22

1.025 1.020 1.015 1.010 1.005

Gain amp vs UTC time for J1406+7828.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 5 created 12-SEP-2005 14:02:27

9 UR IF 4R 1.0 0.8 0.6 0.4 0.2 9 UR IF 4L 0.8 0.6 0.4 0.2 10 CM IF 3R 1.0 0.9 0.8 10 CM IF 3L 1.4 1.2 1.0 0.8 10 CM IF 4R

1.210 1.205 1.200 1.195

10 CM IF 4L

Gain

TIME (HOURS)

23 15 16 17 18 19 20 21 22

0.96 0.94 0.92 0.90