Gain phs vs UTC time for J1406+7828.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 1 created 12-SEP-2005 14:02:19

1 JB IF 1R

0.010 0.005 0.000 -0.005

1 JB IF 1L

0.010 0.005 0.000 -0.005

1 JB IF 2R

0.010 0.005 0.000 -0.005

1 JB IF 2L

0.010 0.005 0.000 -0.005

1 JB IF 3R

0.010 0.005 0.000 -0.005

1 JB IF 3L

Degrees

0.010 0.005 0.000 -0.005

1 JB IF 4R

0.010 0.005 0.000 -0.005

1 JB IF 4L

0.010 0.005 0.000 -0.005

2 WB IF 1R 100 50 0 2 WB IF 1L

TIME (HOURS)

23 15 16 17 18 19 20 21 22

0 -50 -100

Gain phs vs UTC time for J1406+7828.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 2 created 12-SEP-2005 14:02:19

2 WB IF 2R 100 50 0 2 WB IF 2L 50 0 -50 2 WB IF 3R 200 100 0 2 WB IF 3L 100 50 0 2 WB IF 4R 100 50 0 -50 2 WB IF 4L

Degrees

100 50 0 -50 4 ON IF 1R

-1.725 -1.730 -1.735 -1.740 4 ON IF 1L 0 -50 -100 -150

4 ON IF 2R

1.170 1.165 1.160 1.155 4 ON IF 2L

TIME (HOURS)

23 15 16 17 18 19 20 21 22

-1.450 -1.455 -1.460 -1.465

Gain phs vs UTC time for J1406+7828.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 3 created 12-SEP-2005 14:02:19

4 ON IF 3R

-4.355 -4.360 -4.365 -4.370 4 ON IF 3L

-0.500 -0.505 -0.510 -0.515

4 ON IF 4R 100 50 0 4 ON IF 4L

-1.245 -1.250 -1.255 -1.260 6 TR IF 1R 100 50 0 6 TR IF 1L

Degrees

0 -50 -100

6 TR IF 3R 200 100 0 6 TR IF 3L 100 50 0 6 TR IF 4R 0 -20 -40 -60 6 TR IF 4L

TIME (HOURS)

23 15 16 17 18 19 20 21 22

100 50 0 -50

Gain phs vs UTC time for J1406+7828.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 4 created 12-SEP-2005 14:02:19

8 SH IF 1R

105.610 105.605 105.600 105.595

8 SH IF 1L

-174.660 -174.665 -174.670 -174.675 8 SH IF 2R 250 200 150 100 50 8 SH IF 2L -80 -100 -120

8 SH IF 3L

75.915 75.910 75.905 75.900

9 UR IF 1R

Degrees

355 350 345 340 9 UR IF 1L 10 5 0 9 UR IF 2R 150 100 50 0 9 UR IF 2L 0 -20 -40 9 UR IF 3R

TIME (HOURS)

23 15 16 17 18 19 20 21 22

350 300 250 200 150

Gain phs vs UTC time for J1406+7828.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 5 created 12-SEP-2005 14:02:19

9 UR IF 3L 100 0 -100

9 UR IF 4R 100 50 0 -50 9 UR IF 4L 360 340 320 10 CM IF 3R 200 100 0 10 CM IF 3L 100 0 -100

10 CM IF 4R

Degrees

350 300 250 200 10 CM IF 4L

TIME (HOURS)

23 15 16 17 18 19 20 21 22

100 0 -100