Gain amp vs UTC time for J1752+1734.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 1 created 12-SEP-2005 14:03:46

1 JB IF 1R

0.815 0.810 0.805 0.800 1 JB IF 1L

0.885 0.880 0.875 0.870 1 JB IF 2R

0.865 0.860 0.855 0.850 1 JB IF 2L

0.880 0.875 0.870 0.865

1 JB IF 3R

0.835 0.830 0.825 0.820

1 JB IF 3L

Gain

0.830 0.825 0.820 0.815 1 JB IF 4R

0.840 0.835 0.830 0.825 1 JB IF 4L

0.850 0.845 0.840 0.835

2 WB IF 1R

1.05

1.00

2 WB IF 1L

TIME (HOURS)

23 45 46 47 48 49 50 51 52

1.02 1.00 0.98 0.96

Gain amp vs UTC time for J1752+1734.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 2 created 12-SEP-2005 14:03:46

2 WB IF 2R

0.93 0.92 0.91 0.90

2 WB IF 2L

1.10 1.05 1.00 0.95

2 WB IF 3R

0.96 0.94 0.92 0.90 0.88 0.86 2 WB IF 3L

0.92

0.91

0.90

2 WB IF 4R

1.08 1.06 1.04 1.02 1.00 0.98

2 WB IF 4L

Gain

1.06

1.04

1.02

4 ON IF 1R

0.95

0.94

0.93

4 ON IF 1L

0.94

0.92

0.90 4 ON IF 2R

0.96 0.94 0.92

4 ON IF 2L

TIME (HOURS)

23 45 46 47 48 49 50 51 52

1.2 1.1 1.0 0.9

Gain amp vs UTC time for J1752+1734.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 3 created 12-SEP-2005 14:03:46

4 ON IF 3R

1.00

0.98

0.96 4 ON IF 3L

1.01

1.00

0.99

4 ON IF 4R

1.02 1.00 0.98 0.96 0.94 0.92 4 ON IF 4L

0.98

0.96

0.94

6 TR IF 1R

1.10

1.05

1.00 6 TR IF 1L

Gain

0.86

0.84

0.82 6 TR IF 3R

1.05 1.00 0.95 0.90 0.85 6 TR IF 3L

0.92 0.90 0.88 0.86 0.84 0.82 6 TR IF 4R 1.0 0.9 0.8 6 TR IF 4L

TIME (HOURS)

23 45 46 47 48 49 50 51 52

0.96 0.94 0.92 0.90

Gain amp vs UTC time for J1752+1734.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 4 created 12-SEP-2005 14:03:46

9 UR IF 1R 1.1 1.0 0.9 0.8 9 UR IF 1L 0.9 0.8 0.7 9 UR IF 2R

1.13 1.12 1.11 1.10 1.09 9 UR IF 2L 1.2 1.0 0.8 9 UR IF 3R

1.18 1.16 1.14 1.12 1.10 1.08 9 UR IF 3L

Gain

0.98

0.96

0.94

9 UR IF 4R

1.05 1.00 0.95 0.90

9 UR IF 4L 0.9 0.8 0.7 10 CM IF 2R

0.98 0.96 0.94 0.92 0.90 0.88

10 CM IF 2L

TIME (HOURS)

23 45 46 47 48 49 50 51 52

1.4 1.3 1.2

Gain amp vs UTC time for J1752+1734.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 5 created 12-SEP-2005 14:03:46

10 CM IF 3R

0.90 0.88 0.86

10 CM IF 3L

0.92 0.90 0.88 0.86

10 CM IF 4R

1.16 1.14 1.12

10 CM IF 4L

Gain

TIME (HOURS)

23 45 46 47 48 49 50 51 52

1.8 1.6 1.4 1.2 1.0