Gain amp vs UTC time for J1756+1535.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 1 created 12-SEP-2005 14:04:14

1 JB IF 1R

0.790 0.785 0.780 0.775 1 JB IF 1L

0.790 0.785 0.780 0.775

1 JB IF 2R

0.895 0.890 0.885 0.880 1 JB IF 2L

1.030 1.025 1.020 1.015

1 JB IF 3R

0.885 0.880 0.875 0.870 1 JB IF 3L

Gain

0.875 0.870 0.865 0.860

1 JB IF 4R

0.935 0.930 0.925 0.920

1 JB IF 4L

0.890 0.885 0.880 0.875 2 WB IF 1R

1.00

0.95

2 WB IF 1L

TIME (HOURS)

23 55 56 57 58 59 1/00 00 01 02

1.02 1.00 0.98 0.96 0.94 0.92

Gain amp vs UTC time for J1756+1535.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 2 created 12-SEP-2005 14:04:14

2 WB IF 2R

0.860

0.855

2 WB IF 2L 1.1 1.0 0.9 2 WB IF 3R

0.90 0.88 0.86 0.84 0.82

2 WB IF 3L

0.85 0.80 0.75

2 WB IF 4R

0.95 0.90 0.85 0.80

2 WB IF 4L

Gain

0.95 0.90 0.85

4 ON IF 1R

1.02 1.00 0.98

4 ON IF 1L

1.08 1.06 1.04 1.02 1.00

4 ON IF 2R 1.0 0.9 0.8 4 ON IF 2L

TIME (HOURS)

23 55 56 57 58 59 1/00 00 01 02

1.05 1.00 0.95

Gain amp vs UTC time for J1756+1535.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 3 created 12-SEP-2005 14:04:14

4 ON IF 3R 1.2 1.0 0.8 4 ON IF 3L

0.90 0.89 0.88

4 ON IF 4R

1.00 0.98 0.96 0.94

4 ON IF 4L

0.93

0.92

0.91

6 TR IF 1R 1.2 1.1 1.0 6 TR IF 1L

Gain

0.90

0.88

0.86

6 TR IF 3R

1.08 1.06 1.04 1.02 1.00

6 TR IF 3L 0.9 0.8 0.7 6 TR IF 4R

1.12 1.10 1.08 1.06 1.04 6 TR IF 4L

TIME (HOURS)

23 55 56 57 58 59 1/00 00 01 02

0.95 0.90 0.85 0.80

Gain amp vs UTC time for J1756+1535.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 4 created 12-SEP-2005 14:04:14

9 UR IF 1R 1.0 0.9 0.8 9 UR IF 1L 1.0 0.8 0.6 9 UR IF 2R

0.960 0.955 0.950 0.945

9 UR IF 2L 0.9 0.8 0.7 0.6 0.5 9 UR IF 3R 1.0 0.9 0.8 9 UR IF 3L

Gain

0.9 0.8 0.7 9 UR IF 4R 0.9 0.8 0.7 9 UR IF 4L

0.80 0.75 0.70

10 CM IF 3R

1.05 1.00 0.95 0.90 0.85

10 CM IF 3L

TIME (HOURS)

23 55 56 57 58 59 1/00 00 01 02

1.00 0.95 0.90 0.85

Gain amp vs UTC time for J1756+1535.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 5 created 12-SEP-2005 14:04:14

10 CM IF 4R

1.020 1.015 1.010 1.005

10 CM IF 4L 2.5 2.0 1.5 1.0 11 HH IF 2R

0.75 0.70 0.65 0.60 0.55

11 HH IF 3R

0.92

0.91

0.90

11 HH IF 3L 1.8 1.6 1.4 1.2 1.0 11 HH IF 4R

Gain

0.9 0.8 0.7 11 HH IF 4L

TIME (HOURS)

23 55 56 57 58 59 1/00 00 01 02

0.9 0.8 0.7