Center at RA 17 56 53.10213 DEC 15 35 20.8266

CONT: J1756+15 IPOL 1652.803 MHZ J1756+1535.ICL001.5

PLot file version 1 created 12-SEP-2005 14:06:03

Cont peak flux = 7.2183E-02 JY/BEAM Levs = 7.218E-02 * (-0.028, 0.028, 0.057, 0.114, 0.227, 0.454, 0.908)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250