Gain amp vs UTC time for J2129-1821.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 1 created 12-SEP-2005 14:45:46

1 JB IF 1R

45.955 45.950 45.945 45.940

1 JB IF 2R

15.170 15.165 15.160 15.155

1 JB IF 2L

41.255 41.250 41.245 41.240

1 JB IF 4L

23.995 23.990 23.985 23.980 2 WB IF 1R

1.185 1.180 1.175 1.170 1.165 2 WB IF 1L

Gain

1.12 1.10 1.08 1.06 2 WB IF 2R

1.16 1.14 1.12 1.10 1.08

2 WB IF 2L

1.12 1.10 1.08 1.06 2 WB IF 3R

0.98 0.96 0.94 0.92 0.90

2 WB IF 3L

TIME (HOURS)

1/00 31 32 33 34 35 36 37 38

0.98

0.96

0.94

Gain amp vs UTC time for J2129-1821.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 2 created 12-SEP-2005 14:45:46

2 WB IF 4R

1.10 1.08 1.06 1.04 1.02

2 WB IF 4L

1.05

1.00

6 TR IF 1R

0.63

0.62

0.61 6 TR IF 1L

0.92 0.90 0.88 0.86 0.84

6 TR IF 3R

1.10

1.05

1.00

6 TR IF 3L

Gain

0.98 0.96 0.94 0.92 0.90 6 TR IF 4R

1.25 1.20 1.15 1.10 1.05

6 TR IF 4L

1.00

0.95

0.90

8 SH IF 1R 1.1 1.0 0.9 8 SH IF 1L

TIME (HOURS)

1/00 31 32 33 34 35 36 37 38

1.0 0.9 0.8

Gain amp vs UTC time for J2129-1821.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 3 created 12-SEP-2005 14:45:46

8 SH IF 2R

1.00

0.95

0.90 8 SH IF 2L

0.98 0.96 0.94 0.92 0.90 0.88 8 SH IF 3R

1.15 1.10 1.05 1.00

8 SH IF 3L

1.04 1.02 1.00 0.98 8 SH IF 4R 1.1 1.0 0.9 8 SH IF 4L

Gain

1.02 1.00 0.98 0.96 0.94 0.92 9 UR IF 1R

0.96

0.94

0.92

9 UR IF 1L

0.90 0.88 0.86 0.84 9 UR IF 2R

0.94

0.92

0.90

9 UR IF 2L

TIME (HOURS)

1/00 31 32 33 34 35 36 37 38

0.89 0.88 0.87 0.86 0.85

Gain amp vs UTC time for J2129-1821.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 4 created 12-SEP-2005 14:45:46

9 UR IF 3R

1.15

1.10

1.05 9 UR IF 3L

0.95

0.94

0.93 9 UR IF 4R

1.12 1.10 1.08 1.06 1.04 1.02 9 UR IF 4L

1.02 1.00 0.98 0.96 0.94

10 CM IF 3R

0.70

0.65

0.60

10 CM IF 3L

Gain

0.68 0.66 0.64 0.62

10 CM IF 4R

0.90 0.88 0.86 0.84

10 CM IF 4L 1.2 1.0 0.8 11 HH IF 1R

0.96

0.94

0.92

0.90 11 HH IF 1L

TIME (HOURS)

1/00 31 32 33 34 35 36 37 38

1.08 1.06 1.04 1.02 1.00 0.98

Gain amp vs UTC time for J2129-1821.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 5 created 12-SEP-2005 14:45:46

11 HH IF 2R

0.94 0.92 0.90 0.88 0.86

11 HH IF 2L

1.15 1.10 1.05 1.00

11 HH IF 3R

1.15 1.10 1.05 1.00

11 HH IF 3L

1.15

1.10

1.05

11 HH IF 4R 1.1 1.0 0.9 11 HH IF 4L

Gain

TIME (HOURS)

1/00 31 32 33 34 35 36 37 38

1.20 1.15 1.10 1.05