Gain amp vs UTC time for J2130-0927.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 1 created 12-SEP-2005 15:08:12

1 JB IF 1R

0.780 0.775 0.770 0.765 1 JB IF 1L

0.800 0.795 0.790 0.785

1 JB IF 2R

0.845 0.840 0.835 0.830 1 JB IF 2L

1.000 0.995 0.990 0.985

1 JB IF 3R

0.900 0.895 0.890 0.885 1 JB IF 3L

Gain

0.870 0.865 0.860 0.855

1 JB IF 4R 1.6 1.4 1.2 1.0 1 JB IF 4L

0.950 0.945 0.940 0.935 2 WB IF 1R

1.000 0.995 0.990 0.985 2 WB IF 1L

TIME (HOURS)

1/00 44 30 45 00 30 46 00 30 47 00 30

0.945 0.940 0.935 0.930

Gain amp vs UTC time for J2130-0927.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 2 created 12-SEP-2005 15:08:12

2 WB IF 2R

33.475 33.470 33.465 33.460 2 WB IF 2L

5.285 5.280 5.275 5.270 2 WB IF 3R 2.0 1.5 1.0 2 WB IF 3L

0.870 0.865 0.860 0.855

2 WB IF 4R

0.920 0.915 0.910 0.905 2 WB IF 4L

Gain

0.925 0.920 0.915 0.910 4 ON IF 1R

0.945 0.940 0.935 0.930

4 ON IF 1L

0.960 0.955 0.950 0.945

4 ON IF 2R 2.0 1.5 1.0 4 ON IF 2L

TIME (HOURS)

1/00 44 30 45 00 30 46 00 30 47 00 30

0.955 0.950 0.945 0.940

Gain amp vs UTC time for J2130-0927.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 3 created 12-SEP-2005 15:08:12

4 ON IF 3R

0.885 0.880 0.875 0.870

4 ON IF 3L

0.905 0.900 0.895 0.890

4 ON IF 4R

0.880 0.875 0.870 0.865

4 ON IF 4L

0.925 0.920 0.915 0.910

6 TR IF 1R

0.685 0.680 0.675 0.670

6 TR IF 1L

Gain

0.880 0.875 0.870 0.865

6 TR IF 3R

0.750 0.745 0.740 0.735

6 TR IF 3L

0.915 0.910 0.905 0.900

6 TR IF 4R

0.915 0.910 0.905 0.900

6 TR IF 4L

TIME (HOURS)

1/00 44 30 45 00 30 46 00 30 47 00 30

0.845 0.840 0.835 0.830

Gain amp vs UTC time for J2130-0927.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 4 created 12-SEP-2005 15:08:12

8 SH IF 1R

0.880 0.875 0.870 0.865

8 SH IF 1L

0.900 0.895 0.890 0.885

8 SH IF 2R

0.885 0.880 0.875 0.870

8 SH IF 2L

0.820 0.815 0.810 0.805

8 SH IF 3R

1.010 1.005 1.000 0.995

8 SH IF 3L

Gain

0.990 0.985 0.980 0.975

8 SH IF 4R

0.885 0.880 0.875 0.870

8 SH IF 4L

0.775 0.770 0.765 0.760

9 UR IF 1R

0.770 0.765 0.760 0.755

9 UR IF 1L

TIME (HOURS)

1/00 44 30 45 00 30 46 00 30 47 00 30

0.710 0.705 0.700 0.695

Gain amp vs UTC time for J2130-0927.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 5 created 12-SEP-2005 15:08:12

9 UR IF 2R

0.945 0.940 0.935 0.930

9 UR IF 2L

0.880 0.875 0.870 0.865

9 UR IF 3R

1.100 1.095 1.090 1.085

9 UR IF 3L

0.925 0.920 0.915 0.910

9 UR IF 4R

0.970 0.965 0.960 0.955

9 UR IF 4L

Gain

0.825 0.820 0.815 0.810

10 CM IF 3R

0.845 0.840 0.835 0.830

10 CM IF 3L

0.835 0.830 0.825 0.820

10 CM IF 4R

1.165 1.160 1.155 1.150

10 CM IF 4L

TIME (HOURS)

1/00 44 30 45 00 30 46 00 30 47 00 30

0.95 0.90 0.85 0.80 0.75

Gain amp vs UTC time for J2130-0927.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 6 created 12-SEP-2005 15:08:12

11 HH IF 1R 0.8 0.6 0.4 0.2 11 HH IF 1L 1.0 0.8 0.6 0.4 0.2 11 HH IF 2R

0.945 0.940 0.935 0.930

11 HH IF 2L

1.010 1.005 1.000 0.995

11 HH IF 3R

0.910 0.905 0.900 0.895

11 HH IF 3L

Gain

0.965 0.960 0.955 0.950

11 HH IF 4R

0.950 0.945 0.940 0.935

11 HH IF 4L

TIME (HOURS)

1/00 44 30 45 00 30 46 00 30 47 00 30

1.010 1.005 1.000 0.995