Gain phs vs UTC time for J2130-0927.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 1 created 12-SEP-2005 15:08:05

1 JB IF 1R

-13.825 -13.830 -13.835 -13.840

1 JB IF 1L -50 -100

1 JB IF 2R 0 -20 -40 -60 -80 1 JB IF 2L 0 -10 -20 -30 1 JB IF 3R

3.090 3.085 3.080 3.075 1 JB IF 3L

Degrees

4.710 4.705 4.700 4.695

1 JB IF 4R

4.005 4.000 3.995 3.990

1 JB IF 4L 0 -20 -40 -60 -80 2 WB IF 1R

0.010 0.005 0.000 -0.005

2 WB IF 1L

TIME (HOURS)

1/00 44 30 45 00 30 46 00 30 47 00 30

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for J2130-0927.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 2 created 12-SEP-2005 15:08:05

2 WB IF 2R

0.010 0.005 0.000 -0.005

2 WB IF 2L

0.010 0.005 0.000 -0.005

2 WB IF 3R

0.010 0.005 0.000 -0.005

2 WB IF 3L

0.010 0.005 0.000 -0.005

2 WB IF 4R

0.010 0.005 0.000 -0.005

2 WB IF 4L

0.010 0.005 0.000 -0.005

4 ON IF 1R

-3.620 -3.625 -3.630 -3.635 4 ON IF 1L

-4.140 -4.145 -4.150 -4.155 4 ON IF 2R

-5.885 -5.890 -5.895 -5.900 4 ON IF 2L

TIME (HOURS)

1/00 44 30 45 00 30 46 00 30 47 00 30

-5.855 -5.860 -5.865 -5.870

Gain phs vs UTC time for J2130-0927.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 3 created 12-SEP-2005 15:08:05

4 ON IF 3R

10.055 10.050 10.045 10.040

4 ON IF 3L

8.090 8.085 8.080 8.075

4 ON IF 4R

-1.700 -1.705 -1.710 -1.715

4 ON IF 4L

-3.945 -3.950 -3.955 -3.960

6 TR IF 1R

-8.670 -8.675 -8.680 -8.685

6 TR IF 1L

-7.965 -7.970 -7.975 -7.980

6 TR IF 3R

6.975 6.970 6.965 6.960 6 TR IF 3L

10.380 10.375 10.370 10.365

6 TR IF 4R

-4.370 -4.375 -4.380 -4.385

6 TR IF 4L

TIME (HOURS)

1/00 44 30 45 00 30 46 00 30 47 00 30

-7.555 -7.560 -7.565 -7.570

Gain phs vs UTC time for J2130-0927.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 4 created 12-SEP-2005 15:08:05

8 SH IF 1R

-3.990 -3.995 -4.000 -4.005

8 SH IF 1L

-5.110 -5.115 -5.120 -5.125

8 SH IF 2R

1.300 1.295 1.290 1.285

8 SH IF 2L 150 100 50 0 8 SH IF 3R

0.290 0.285 0.280 0.275

8 SH IF 3L 0 -20 -40 -60 -80 8 SH IF 4R

1.520 1.515 1.510 1.505

8 SH IF 4L

2.655 2.650 2.645 2.640

9 UR IF 1R

-2.755 -2.760 -2.765 -2.770

9 UR IF 1L

TIME (HOURS)

1/00 44 30 45 00 30 46 00 30 47 00 30

-1.885 -1.890 -1.895 -1.900

Gain phs vs UTC time for J2130-0927.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 5 created 12-SEP-2005 15:08:05

9 UR IF 2R 350 300 250 200 9 UR IF 2L

-2.540 -2.545 -2.550 -2.555

9 UR IF 3R

12.305 12.300 12.295 12.290

9 UR IF 3L 20 10 0 9 UR IF 4R 0 -50 -100

9 UR IF 4L

1.175 1.170 1.165 1.160

10 CM IF 3R

0.530 0.525 0.520 0.515

10 CM IF 3L

-0.020 -0.025 -0.030 -0.035

10 CM IF 4R

6.390 6.385 6.380 6.375

10 CM IF 4L

TIME (HOURS)

1/00 44 30 45 00 30 46 00 30 47 00 30

4.290 4.285 4.280 4.275

Gain phs vs UTC time for J2130-0927.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 6 created 12-SEP-2005 15:08:05

11 HH IF 1R

3.645 3.640 3.635 3.630

11 HH IF 1L 100 50 0 11 HH IF 2R

-5.945 -5.950 -5.955 -5.960

11 HH IF 2L

-7.310 -7.315 -7.320 -7.325

11 HH IF 3R

4.785 4.780 4.775 4.770

11 HH IF 3L 0 -50 -100 -150

11 HH IF 4R

5.905 5.900 5.895 5.890

11 HH IF 4L

TIME (HOURS)

1/00 44 30 45 00 30 46 00 30 47 00 30

5.305 5.300 5.295 5.290