Center at RA 21 30 19.08825 DEC -09 27 37.4351

CONT: J2130-09 IPOL 1652.803 MHZ J2130-0927.ICL001.5

PLot file version 1 created 12-SEP-2005 15:09:17

Cont peak flux = 1.8377E-01 JY/BEAM Levs = 1.838E-01 * (-0.060, 0.060, 0.121, 0.241, 0.482, 0.964)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250