Gain amp vs UTC time for J2131-1207.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 1 created 12-SEP-2005 15:08:30

1 JB IF 1R

0.650 0.645 0.640 0.635 1 JB IF 1L

0.665 0.660 0.655 0.650 1 JB IF 2R

0.705 0.700 0.695 0.690 1 JB IF 2L

0.815 0.810 0.805 0.800

1 JB IF 3R

0.770 0.765 0.760 0.755

1 JB IF 3L

Gain

0.755 0.750 0.745 0.740 1 JB IF 4R

0.820 0.815 0.810 0.805 1 JB IF 4L

0.785 0.780 0.775 0.770 2 WB IF 1R 1.3 1.2 1.1 2 WB IF 1L

TIME (HOURS)

1/00 51 52 53 54 55 56 57 58

1.15 1.10 1.05 1.00

Gain amp vs UTC time for J2131-1207.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 2 created 12-SEP-2005 15:08:30

2 WB IF 2R

1.05 1.00 0.95

2 WB IF 2L

1.05

1.00

0.95 2 WB IF 3R

1.00 0.95 0.90 0.85 2 WB IF 3L

0.95 0.90 0.85 2 WB IF 4R

1.05 1.00 0.95 2 WB IF 4L

Gain

1.05

1.00

0.95 4 ON IF 1R

1.00 0.95 0.90 0.85 4 ON IF 1L

1.00 0.95 0.90 4 ON IF 2R

1.00 0.95 0.90

4 ON IF 2L

TIME (HOURS)

1/00 51 52 53 54 55 56 57 58

1.00

0.95

0.90

Gain amp vs UTC time for J2131-1207.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 3 created 12-SEP-2005 15:08:30

4 ON IF 3R

1.05

1.00

0.95

0.90

4 ON IF 3L

1.05

1.00

0.95

4 ON IF 4R

1.00 0.98 0.96 0.94 0.92

4 ON IF 4L

1.00

0.98

0.96

6 TR IF 1R

0.72 0.70 0.68 0.66 0.64

6 TR IF 1L

Gain

2.0 1.5 1.0 6 TR IF 3R

0.86 0.84 0.82 0.80

6 TR IF 3L

0.995 0.990 0.985 0.980 0.975 6 TR IF 4R

0.99

0.98

0.97

6 TR IF 4L

TIME (HOURS)

1/00 51 52 53 54 55 56 57 58

1.05

1.00

0.95

Gain amp vs UTC time for J2131-1207.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 4 created 12-SEP-2005 15:08:30

8 SH IF 1R

0.95 0.90 0.85 0.80 8 SH IF 1L

0.95 0.90 0.85

8 SH IF 2R

0.95 0.90 0.85 0.80 8 SH IF 2L

0.90 0.88 0.86 0.84 0.82 8 SH IF 3R

1.15

1.10

1.05

8 SH IF 3L

Gain

1.10 1.08 1.06 1.04 8 SH IF 4R

1.15

1.10

1.05 8 SH IF 4L

1.20 1.15 1.10 1.05

9 UR IF 1R 1.0 0.9 0.8 9 UR IF 1L

TIME (HOURS)

1/00 51 52 53 54 55 56 57 58

1.0 0.9 0.8

Gain amp vs UTC time for J2131-1207.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 5 created 12-SEP-2005 15:08:30

9 UR IF 2R

1.10 1.05 1.00

9 UR IF 2L

1.05 1.00 0.95 0.90

9 UR IF 3R 1.2 1.1 1.0 9 UR IF 3L 1.1 1.0 0.9 9 UR IF 4R

1.075 1.070 1.065

9 UR IF 4L

Gain

1.02 1.00 0.98 0.96 0.94 0.92

10 CM IF 3R

0.90 0.85 0.80 0.75

10 CM IF 3L

0.90 0.85 0.80

10 CM IF 4R

1.20 1.15 1.10 1.05

10 CM IF 4L

TIME (HOURS)

1/00 51 52 53 54 55 56 57 58

0.95 0.90 0.85

Gain amp vs UTC time for J2131-1207.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 6 created 12-SEP-2005 15:08:30

11 HH IF 1R 1.6 1.4 1.2 1.0 0.8 11 HH IF 1L 2.0 1.5 1.0 11 HH IF 2R 1.4 1.2 1.0 11 HH IF 2L 1.4 1.2 1.0 0.8 11 HH IF 3R 1.6 1.4 1.2 1.0 11 HH IF 3L

Gain

1.8 1.6 1.4 1.2 1.0 0.8 11 HH IF 4R 1.5 1.4 1.3 1.2 1.1 11 HH IF 4L

TIME (HOURS)

1/00 51 52 53 54 55 56 57 58

1.6 1.4 1.2