Gain phs vs UTC time for J2131-1207.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 1 created 12-SEP-2005 15:08:19

1 JB IF 1R 200 100 0 1 JB IF 1L

0.545 0.540 0.535 0.530 1 JB IF 2R 0 -20 -40 1 JB IF 2L

0.605 0.600 0.595 0.590 1 JB IF 3R 350 300 250 1 JB IF 3L

Degrees

20 10 0 1 JB IF 4R -2 -4 -6 -8 -10 1 JB IF 4L

0.325 0.320 0.315 0.310 2 WB IF 1R

0.010 0.005 0.000 -0.005

2 WB IF 1L

TIME (HOURS)

1/00 51 52 53 54 55 56 57 58

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for J2131-1207.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 2 created 12-SEP-2005 15:08:19

2 WB IF 2R

0.010 0.005 0.000 -0.005

2 WB IF 2L

0.010 0.005 0.000 -0.005

2 WB IF 3R

0.010 0.005 0.000 -0.005

2 WB IF 3L

0.010 0.005 0.000 -0.005

2 WB IF 4R

0.010 0.005 0.000 -0.005

2 WB IF 4L

Degrees

0.010 0.005 0.000 -0.005

4 ON IF 1R 5 0 -5 -10 -15 4 ON IF 1L 4 2 0 -2 4 ON IF 2R 2 0 -2 -4 4 ON IF 2L

TIME (HOURS)

1/00 51 52 53 54 55 56 57 58

4 2 0 -2

Gain phs vs UTC time for J2131-1207.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 3 created 12-SEP-2005 15:08:19

4 ON IF 3R 4 2 0 -2 -4 4 ON IF 3L 4 2 0 -2 4 ON IF 4R 4 2 0 -2 -4 4 ON IF 4L 4 2 0 -2 6 TR IF 1R 10 0 -10 6 TR IF 1L

Degrees

2 0 -2 -4 6 TR IF 3R 10 0 -10 6 TR IF 3L 0 -5 -10 -15 6 TR IF 4R 10 0 -10 6 TR IF 4L

TIME (HOURS)

1/00 51 52 53 54 55 56 57 58

10 0 -10

Gain phs vs UTC time for J2131-1207.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 4 created 12-SEP-2005 15:08:19

8 SH IF 1R 2 0 -2 -4 -6 -8 8 SH IF 1L 10 5 0 8 SH IF 2R 0 -5 8 SH IF 2L 4 2 0 -2 -4 8 SH IF 3R 10 5 0 -5 8 SH IF 3L

Degrees

5 0 -5 8 SH IF 4R 10 5 0 -5 8 SH IF 4L 360 358 356 9 UR IF 1R 10 0 -10 9 UR IF 1L

TIME (HOURS)

1/00 51 52 53 54 55 56 57 58

10 5 0

Gain phs vs UTC time for J2131-1207.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 5 created 12-SEP-2005 15:08:19

9 UR IF 2R 5 0 9 UR IF 2L 5 0 -5 -10 9 UR IF 3R 10 0 -10 9 UR IF 3L 10 5 0 -5 9 UR IF 4R 5 0 9 UR IF 4L

Degrees

5 0 10 CM IF 3R 10 5 0 -5 10 CM IF 3L 10 5 0 -5 10 CM IF 4R 10 5 0 -5 10 CM IF 4L

TIME (HOURS)

1/00 51 52 53 54 55 56 57 58

0 -2 -4 -6

Gain phs vs UTC time for J2131-1207.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 6 created 12-SEP-2005 15:08:19

11 HH IF 1R 10 5 0 -5 11 HH IF 1L 20 10 0 -10 11 HH IF 2R 30 20 10 11 HH IF 2L 20 10 0 -10 11 HH IF 3R 5 0 -5 11 HH IF 3L

Degrees

356 354 352 350 348 11 HH IF 4R -6 -8 -10 11 HH IF 4L

TIME (HOURS)

1/00 51 52 53 54 55 56 57 58

-7.5 -8.0 -8.5