Center at RA 21 31 35.26176 DEC -12 07 04.7960

CONT: J2131-12 IPOL 1652.803 MHZ J2131-1207.ICL001.5

PLot file version 1 created 12-SEP-2005 15:09:23

Cont peak flux = 1.4182E+00 JY/BEAM Levs = 1.418E+00 * (-0.032, 0.032, 0.063, 0.127, 0.253, 0.507)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250