Center at RA 00 19 45.78642 DEC 73 27 30.0175

CONT: J0019+73 IPOL 1656.365 MHZ J0019+7327.ICL001.5

PLot file version 1 created 15-SEP-2005 12:35:56

Cont peak flux = 3.0333E-01 JY/BEAM Levs = 3.033E-01 * (-0.016, 0.016, 0.032, 0.065, 0.130, 0.260, 0.519)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250