Center at RA 00 21 02.81375 DEC 71 50 20.7709

CONT: J0021+71 IPOL 1656.365 MHZ J0021+7150.ICL001.5

PLot file version 1 created 15-SEP-2005 12:36:20

Cont peak flux = 1.0941E-01 JY/BEAM Levs = 1.094E-01 * (-0.018, 0.018, 0.035, 0.071, 0.142, 0.283, 0.566)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250