Center at RA 00 30 14.41296 DEC 70 37 40.0607

CONT: J0030+70 IPOL 1656.365 MHZ J0030+7037.ICL001.5

PLot file version 1 created 15-SEP-2005 12:36:29

Cont peak flux = 3.6072E-01 JY/BEAM Levs = 3.607E-01 * (-0.030, 0.030, 0.060, 0.120, 0.240, 0.481, 0.961)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250